Selected List of Swan Sonnenschein & Co.'s Publications
Date: 2012-09-11T00:00:00+00:00
Keywords: Publishers' catalogs -- England -- London; Swan Sonnenschein & Co. -- Catalogs

The Project Gutenberg eBook of Selected List of Swan Sonnenschein & Co.'s Publications

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: Selected List of Swan Sonnenschein & Co.'s Publications

Author: Swan Sonnenschein & Co.

Release date: September 11, 2012 [eBook #40730]
Most recently updated: October 23, 2024

Language: English

Credits: Produced by Chris Curnow and the Online Distributed
Proofreading Team at http://www.pgdp.net (This file was
produced from images generously made available by The
Internet Archive.)

*** START OF THE PROJECT GUTENBERG EBOOK SELECTED LIST OF SWAN SONNENSCHEIN & CO.'S PUBLICATIONS ***

Paternoster Square.] [April 1st, 1886.

Selected List of

SWAN SONNENSCHEIN & Co.’s

Publications.

For SUBJECT INDEX, see pp. 27-32.

Abdy-Williams. Novels by E. M. Abdy-Williams:

Two Ifs. 1 vol. ed. Cr. 8vo. 3s. 6d.

Forewarned! Fcap. 8vo. 1s.

For his Friend. 3 vols. Cr. 8vo 31s. 6d.

Adams. Novels by Mrs. Leith-Adams. Cheap Editions.

Each vol. cr. 8vo, cloth extra, 3s. 6d.

Geoffrey Stirling.

Madelon Lemoine.

Cosmo Gordon. [Shortly.

Lady Deane. [Shortly.

Adams, Rev. F. A. My Man and I; or, the Modern Nehemiah. 8vo, cloth, 7s. 6d.

Adams. Books by W. H. Davenport Adams:

A Book of Earnest Lives. With 8 portraits and plates. Demy 8vo, cloth gilt, gilt edges, 7s. 6d.

Dean Colet, Roger Ascham, Lady Mary Montagu, Robert Raikes, Lord Brougham, Dr. Arnold, J. F. Oberlin, Mary Carpenter, Wm. Wilberforce, Sir T. F. Buxton, John Eliot, John Howard, Mrs. Fry, Mrs. Mompesson, Sister Dora, and others.

Battle Stories from English and European History. Second Edition. With 16 plates and plans. Demy 8vo, cloth gilt, gilt edges, 7s. 6d.

European: Byzantium, Cressy, Poictiers, Navarette, Agincourt, Lützen, Blenheim, Malplaquet, Pultowa, Waterloo, Inkerman. English: Hastings, Falkirk, Bannockburn, Bosworth Field, Flodden Field, Marston Moor, Naseby, Culloden. Anglo-Indian: Plassey, Haiderabad, Guzerat; and others.

Girlhood of Remarkable Women. Second Edition, enlarged. With 8 plates. Demy 8vo, cloth gilt, gilt edges, 7s. 6d.

Harriet Martineau, Fanny Burney, Elizabeth Inchbald, Charlotte Brontë, Sara Coleridge, Mary Somerville, Mary Russell Mitford, Lady Morgan, Lady Jane Grey, Mrs. Hutchinson, Countess of Pembroke, Margaret More, Lady Mary Montagu, Catherine of Siena, Jeanne d’Arc, Mme. de Miramon, Eliz. Carter, Caroline Herschel, Lady Fanshawe, and others.

Celebrated Women Travellers of the Nineteenth Century. Second Edition. With 8 plates. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Frederika Bremer, Ida Pfeiffer, Lady Stanhope, Lady Brassey, Lady Morgan, Mrs. Trollope, Isabella Bird, Lady Florence Dixie, Miss Gordon Cumming, Lady Barker, and others.

Alberg. Books by Albert Alberg:

Gustavus Vasa and his Stirring Times. Third Edition. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Charles XII. and his Stirring Times. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

“Alert.” Cruise of H.M.S. “Alert.” Four Years in Patagonian, Polynesian, and Mascarene Waters. By R. W. Coppinger, M.D. (Staff-surgeon on board). With 16 Plates and several cuts in the text from drawings and photos by the Author and F. North, R.N. Fourth Edition. 8vo, cloth, gilt edges, 6s.

Allen, Grant. The Evolution of Flowers. [In preparation.

Alpine Plants. See Seboth and Bennett; and Bennett.

Althaus. See Schaible and Althaus.

Andersen, Hans. Fairy Tales Set to Music by Annie Armstrong. 4to, cloth, 1s. 6d.; paper, 1s.

Arabian Nights, The New. Select Tales, not included in the editions of Galland or of Lane. Translated by W. F. Kirby (British Museum). Second Edition. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Armstrong, J. Birds and their Ways. Illustrated. Cr. 8vo, cloth gilt, gilt edges. 1s. 6d.

Arthur, T. S. Ten Nights in a Bar-Room. New Illustrated Edition. Cr. 8vo, cloth gilt, 2s.

Auerbach, Berthold. Two Stories (Christian Gellert and The Stepmother). Cuts. Cr. 8vo, cloth gilt, gilt edges, 2s. 6d.

Austin, Jane G. Moonfolk: A True Account of the Home of the Fairies. Second Edition. Illustrated by W. J. Linton. Cr. 8vo, cloth gilt, gilt edges, 2s. 6d. [Fairy Library.

Axon, W. E. A. Gipsy Folk Tales. [In preparation.

Babcock, W. H. Cypress Beach: A Novel. 2 vols. Cr. 8vo, cloth, 12s.

Bagnall, J. E. Handbook of Mosses. With Numerous Woodcuts. Cr. 8vo, cloth, 1s.

Baker, Ella. Stories of Olden Times. Drawn from History and Tradition. Second Edition. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

Barras. Works by Colonel Julius Barras.

India, and Tiger Hunting. 2 vols. cr. 8vo, ea. 3s. 6d.

The New Shikari at our Indian Stations. 2 vols. cr. 8vo, ea. 3s. 6d.

Baxter, Right Hon. W. E., M.P. England and Russia in Asia. Cr. 8vo, cloth, 1s. [Imp. Parl. Ser.

Bennett, A. W., M.A., B.Sc. Tourists’ Guide to the Flora of the Alps. Edited from the work of Prof. K. W. v. Dalla-Torre, and issued under the auspices of the German and Austrian Alpine Club in Vienna. Elegantly printed on very thin but opaque paper, 392 pp., bound as a Morocco pocket-book. Pocket size, 5s.

Best Books, The. A Classified Bibliography of the Best Current English and American Literature, with the Publishers’ names, the prices, and the dates of each work. 4to. [Shortly.

Bevan, J. A., M.D. The March of the Strikers. 1s.

Bevan. Works by G. Phillips Bevan, F.G.S., F.S.S.:

The Royal Relief Atlas of all parts of the Globe, consisting of 31 Embossed Maps. Second Edition. Royal 4to, 21s.

Each Map is separately framed, and the whole bound in one volume, half persian.

The Home Geography. [In preparation.

Guide to Lichfield Cathedral. [In preparation.

Guide to Westminster Abbey. [In preparation.

Bickerdyke. Works by John Bickerdyke, M.A.:

With the Best Intentions: A Tale of Undergraduate Life at Cambridge. Cr. 8vo, cloth, 2s. 6d.

An Irish Midsummer Night’s Dream. Frontispiece. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

Birthday Book, The Floral. By Florence Dudgeon. With Coloured Plates. Imp. 16mo, cloth gilt, gilt edges, 3s. 6d.

Boger, C. G. Elfrica: An Historical Romance of the Twelfth Century. 3 vols. Cr. 8vo, cloth, 31s. 6d.

Bottone, S. R. The Dynamo: How Made and How Used. Numerous Cuts. Cr. 8vo, cloth, 2s. 6d.

Bourne. Works by C. E. Bourne, Barrister-at-law:

Heroes of African Discovery and Adventure.

Series I.—To the Death of Livingstone.

Series II.—To 1883.

Each series in a Second Edition. With Plates and Coloured Maps. Cr. 8vo, cloth gilt, gilt edges, each 3s. 6d.

The Great Composers: Short Lives of Eminent Musicians.

Second Edition. With portraits and plates. Cr. 8vo, cloth, gilt edges, 3s. 6d.

Händel—Bach—Gluck—Haydn—Mozart—Beethoven—Weber-Schubert—Rossini—Mendelssohn—Chopin—Schumann—Berlioz.

Life of Gustavus Adolphus. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

Bowker, J. Goblin Tales of Lancashire. Illustrated by Charles Gliddon. Cr. 8vo, cloth gilt, gilt edges, 2s. 6d. [Fairy Library.

Bradshaw. Works by Mrs. John Bradshaw.

Roger North. 3 vols. Cr. 8vo, 31s. 6d.

Merevale: A Novel. 1 vol. 6s.

Brant, Elizabeth, Head Mistress of the Granby Schools. Systematic Cutting-out for the New Code, from Units of Measurement. With Folding Diagrams in red and black. Cr. 8vo, cloth, 2s.

Broadhurst and Reid. Leasehold Enfranchisement. By Henry Broadhurst, M.P., and R. T. Reid, M.P. Cr. 8vo, cloth, 1s. [Imp. Parl. Ser.

Bulow. Works by the Baroness Bülow:

The Child and Child-Nature. Third Edition. Cuts. Cr. 8vo, cloth, 3s. [Kindergarten Manuals.

Hand-Work and Head-Work: Their Relation to One Another. Cr. 8vo, cloth, 3s. [Kindergarten Manuals.

Burke, Ulick J. Couleur de Rose: A Novel. 2 vols. Cr. 8vo, cloth, 21s.

Butler, E. A. The Entomology of a Pond. [In preparation.

Buxton, Sydney, M.P. Over-Pressure and Elementary Education. Crown 8vo, 2s.; paper, 1s.

See also Imperial Parliament Series, p. 27.

Caballero, Fernan. Book of Spanish Tales. Third Edition. Illustrated by Chas. Harrison. Cr. 8vo, cloth gilt, gilt edges, 2s. 6d. [Fairy Library.

Caine, Hoyle, and Burns. Local Option. By W. S. Caine, M.P., Wm. Hoyle, and Rev. Dawson Burns, D.D. Second Edition. Cr. 8vo, cloth, 1s. [Imp. Parl. Ser.

Cambridge Examiner, The. A Monthly Educational Journal (except in July and August). Demy 8vo, Vols. I.—V. [1885], each 5s. [48 pages, Monthly, 6d.

Camden. Tales by Charles Camden:

The Travelling Menagerie. Illustrated by J. Mahoney. Sm. 8vo, cloth gilt, gilt edges, 2s. 6d.

Hoity Toity, the Good Little Fellow. Illustrated by J. Pettie, R.A. Sm. 8vo, cloth gilt, gilt edges, 2s. 6d.

Cappel, E. S. Old Norse Sagas. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 2s. 6d.

Aslog—Frithiof—Ingeborg—Ragnar Lodbrok—Sigurd—Wayland Smith—Hamlet—and others. [Fairy Library

Chapman. Books by William Chapman:

Notable Women of the Covenant. With portraits and plates, Cr. 8vo, cloth gilt, gilt edges, 2s. 6d.

Notable Women of the Puritan Times. With portraits and plates. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Notable Women of the Reformation. With portraits and plates. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Life of Martin Luther. Cuts. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

Life of John Wiclif. Cuts. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

Children’s Journey, The, and other Stories. By the Author of “Voyage en Zigzac,” etc. Second Edition. Illustrated by the Author. Cr. 8vo, cloth gilt, gilt edges, 3s.

Chitty. Coloured Books by Lily Chitty:

Harlequin Eggs. Twenty-four coloured plates by Lily Chitty. With text by Ismay Thorn. 4to, 2s. 6d.

In and Out. Twenty-four coloured plates by Lily Chitty. With text by Ismay Thorn. 4to, 2s. 6d.

Chitty, W. Practical Beekeeping. 12mo. [At press.

Churchill, Mrs. Spencer. Daisy Darling. A Novel. Cr. 8vo, cloth, 3s. 6d.

Church Rambles and Scrambles. Cr. 8vo, cloth, 2s.

Clarke. Short Biographies by F. L. Clarke. Each vol. illustrated. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

A Book of Golden Friendships. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Childhood of the Prince Consort.

Charlemagne and his Times.

Life of William Tyndale.

George Stephenson.

Robert Stephenson.

Lives of George and Robert Stephenson (in 1 vol). Cloth gilt, gilt edges, 2s. 6d.

Sir Walter Raleigh and his Times.

Claus—Sedgwick. Elementary Text Book of Zoology. By Prof. W. Claus, edited by Adam Sedgwick, M.A., Fellow and Lecturer of Trin. Coll., Cambridge, assisted by F. G. Heathcote, B.A., Trin. Coll., Camb. Illustrated by 706 woodcuts drawn by Prof. Claus. In Two Parts. Demy 8vo, cloth.

Part I. Protozoa to Insecta. 21s.

Part II. Mollusca to Man. 16s.

Clement, Dr. E. Tabular View of Geological Systems. Cr. 8vo, limp cloth, 1s.

Cobbe, Lucy. Doll Stories. Cuts. Cloth, gilt edges, 1s. 6d.

Cockburn, Dr. Samuel. The Laws of Nature and the Laws of God: a Reply to Prof. Drummond. Cr. 8vo, cloth, 3s. 6d.

Conn, William. From Paris to Pekin over Siberian Snows. Edited from the Travels of Victor Meignan by William Conn. With 16 plates. Demy 8vo, cloth extra, 16s.

Contemporary Pulpit, The. A Monthly Homiletic Magazine. Vols. I.-IV. Royal 16mo, cloth extra, gilt top, each 6s. [64 pages, Monthly, 6d.

Cooke. Short Biographies by Frances E. Cooke. Each vol. illustrated. Cr. 8vo, cloth gilt, gilt edges.

A Boy’s Ideal. [Life of Sir Thomas More.] 1s. 6d.

True To Himself. [Life of Savonarola.] 1s. 6d.

Latimer’s Candle. [Life of Latimer.] 1s. 6d.

An English Hero. [Life of Richard Cobden.] 1s. 6d.

Cooper, A. J. Training of the Memory. 12mo. 3d.

Corbett, Mrs. George. Cassandra: A Novel. 3 vols. Cr. 8vo, cloth, 31s. 6d.

Cox, Sir Geo. W., Bart., M.A. The Little Cyclopædia of Common Things. Fourth Edition. Illustrated. Demy 8vo, cloth gilt, 7s. 6d.

Craik, Georgiana M. Twelve Old Friends. With 8 Plates by Ernest Griset. Obl. 4to, cloth gilt. 5s.

Crawford, J. Coutts, F.G.S. The Reform of English Spelling. Cr. 8vo, 6d.

Croker, T. Crofton. Fairy Legends and Traditions of the South of Ireland. New Edition. [Shortly.

Cross—Davidson. Stories of Great Men, taken from Plutarch. By M. Cross and A. J. Davidson. Illustrated. Sm. 8vo, cloth gilt, gilt edges, 3s.

Cupples, Mrs. George. Tappy’s Chicks, and other Links between Nature and Human Nature. With nineteen illustrations. Sm. 8vo. cloth gilt, gilt edges, 2s. 6d.

Dalton, Douglas. False Steps: a Novel. Second Edition. Cr. 8vo, 1s.

Daly, J. Bowles, LL.D. Radical Pioneers of the Nineteenth Century. Crown 8vo, cloth, 6s.

Darton. Books by J. M. Darton:

Brave Boys who have become Illustrious Men of our Time. Fourth Edition. Plates. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Thomas Carlyle—Robert Moffat—Professor Ruskin—George Cruikshank—John Stuckey Reynolds—Henry Deane, F.L.S.—William Chambers, and others.

Famous Girls who have become Illustrious Women of our Time. Twentieth Edition. Plates. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Margaret Roper—“Little Miss Burney”—Laura Bridgman—Felicia Hemans—Harriet Beecher Stowe—Elizabeth Le Brun—Mme. de Staël—Frederika Bremer, and others.

De Portugall, Mme. Synoptical Table of the Kindergarten. Folio, mounted on canvas, and folding into a cloth case, 2s. 6d.

Dilke and Woodall. Women Suffrage. By Mrs. Ashton Dilke and W. Woodall, M.P. Cr. 8vo, cloth, 1s. [Imperial Parliament Series.

Douglas, W. Measure for Measure: a Novel. 2 vols., cr. 8vo, 21s.

Dover. Works by Rev. T. B. Dover, M.A., Vicar of St. Agnes, Kennington.

Lent Manual: Some Quiet Lenten Thoughts. With a Preface by the Bishop of Lincoln. Twelfth Thousand. 12mo, 2s. 6d. Cheap edition, 1s. 6d.

The Ministery of Mercy.

Eastward Ho! A Monthly Magazine. Vols. I.-III., demy 8vo, cloth, each 3s. 6d.

Edwards, F. J. Rules for the Mental Calculator. 12mo, cloth, 1s.

Edwards, R. O. Rabbits for Exhibition, Pleasure, and Market. By R. O. Edwards, assisted by several eminent breeders. With eight plates. Cr. 8vo, limp cloth, 2s. 6d.

Espin, Rev. T. H., M.A. Elementary Star Atlas, with 12 large star-maps. Imperial 8vo, cloth, 1s. 6d.

Evelac, Hamilton. The Leaven of Malice: a Novel. Cr. 8vo, 6s.

Everitt, Graham. English Caricaturists and Graphic Humourists of the Nineteenth Century. Illustrated with a large number of woodcut reproductions of rare caricatures, book illustrations, etc. 4to, cloth extra, gilt top, 42s.

Ewing, R. Handbook of Agriculture. With Preface by Prof. John Scott. 12mo, limp cloth, 6d.

Fairy Library of All Nations.

Series I. Tales of the People (from oral tradition).

Bowker’s Goblin Tales of Lancashire, 2s. 6d.

Caballero’s Book of Spanish Tales, 2s. 6d.

Cappel’s Old Norse Sagas, 2s. 6d.

Fryer’s English Fairy Tales from the North Country, 2s. 6d.

Geldart’s Modern Greek Folklore, 2s. 6d.

Gesta Romanorum, selected and adapted, 2s. 6d.

Matthews’ Hiawatha and other Legends of the Wigwams. [New Edition in preparation.

Rowsell’s Spirit of the Giant Mountains, 2s. 6d.

Stephens’ Old Norse Fairy Tales, 2s. 6d.

Series II. Original Fairy Tales.

Austin’s Moonfolk, 2s. 6d.

Hauff’s Popular Tales, 3s. 6d.

Parker’s Among the Fairies, 2s. 6d.

Faithfull, Mrs. Century Cards: A New Method of teaching Chronology. In box, 10s.

Fawkes. Books by F. A. Fawkes, F.R.H.S.:

Horticultural Buildings, their Construction, Heating, Interior Fittings, etc., with Remarks on the Principles involved, and their application. With 123 cuts. Second Edition. Cr. 8vo, cloth, 3s. 6d.

Hot-water Heating. Cuts. 12mo, 1s.

Babies, and how to Rear them. Cr. 8vo, limp cloth, 6d.

Fillmore, J. C. A History of Pianoforte Music. Edited by Ridley Prentice. Roy. 16mo, cloth, 3s. 6d.

Fleay, F. G., M.A. The Logical English Grammar. Fcap. 8vo, cloth, 2s.

Forbes, Gordon S. Wild Life in Canara and Ganjam. With Coloured Plates. Cr. 8vo, cloth, 6s.

Fowle. Latin and Greek School Books by the Rev. Edmund Fowle, M.A.:

A New Latin Primer. Cr. 8vo. [Shortly.

A Short and Easy Latin Book. New Edition. Post 8vo, 1s. 6d.

A First Easy Latin Reading Book. New Edition. Post 8vo, 3s. 6d.

A Second Easy Latin Reading Book. New Edition. Post 8vo, 3s. 6d.

Selections from Latin Authors: Prose and Verse. Post 8vo, 2s. 6d.; or in two Parts, 1s. 6d. each.

Short and Easy Greek Book. New Edition. Post 8vo, 2s. 6d.

First Easy Greek Reading Book. Containing Fables, Anecdotes of Great Men, Heathen Mythology, etc. New Edition. Post 8vo, 5s.

Second Easy Greek Reading Book. Containing Extracts from Xenophon, and the whole of the First Book of the Iliad. New Edition. Post 8vo, 5s.

First Greek Reader for Use at Eton. New Edition. Post 8vo, 1s. 6d.

The First Book of Homer’s Iliad, in Graduated Lessons, with full notes and vocabularies. Post 8vo, 2s.

Friend. Works by Rev. Hilderic Friend, F.L.S.

Flowers and Flower Lore. Illustrated. Third Edition. 8vo, cloth gilt, gilt edges, 7s. 6d.

The Ministry of Flowers. Illustrated. Crown 8vo, cloth gilt, gilt top, 2s. 6d.

Froebel, Friedrich. Selections from his Writings. Edited by H. K. Moore, B.A., and Mme. Michaelis. [Shortly.

Fryer, Dr. A. C. Book of English Fairy Tales from the North Country. Plates. Cr. 8vo, cloth gilt, gilt edges. 2s. 6d. [Fairy Library.

Fuller, Thomas, D.D.

Life of Thomas Fuller, D.D., the Church Historian. By the Rev. J. M. Fuller, M.D. Second Edition. 2 vols. Cr. 8vo, 12s.

Selections from the Holy and Profane States, with a Short Account of the Author and his Writings. Crown 8vo, 3s. 6d.

Gaussen. Works by Professor Gaussen. Cr. 8vo, each 1s. 6d.

The Iron Kingdom.

The King’s Dream.

The Kingdom of Iron and Clay.

Geldart. Works by Rev. E. M. Geldart, M.A.:

Modern Greek Folklore. Cr. 8vo, leatherette, 2s. 6d.

Sunday for our Little Ones: Addresses to the Young. Cr. 8vo, cloth, gilt edges, 3s.

The Doctrine of the Atonement according to the Epistle of St. Paul. Cr. 8vo, cloth, 3s. 6d.

See also Zacher, p. 26.

Gems from the Poets. Illustrated with thirty coloured designs by A. F. Lydon. Imp. 8vo, cloth extra, gilt edges, 7s. 6d.

Geometry, Plane, The Elements of. Prepared by the Association for the Improvement of Geometrical Teaching. Part I. (corresponding to Euclid Bks. I.—II.) With numerous figures. Cr. 8vo, cloth, 3s. 6d. [Parts II. and III. at press.

George II., History of the Reign of. By Oxon. Cr. 8vo, cloth, 3s. [Student’s Manuals.

George III., History of the Reign of. By Oxon (an Army Tutor). Based on Bright, Macaulay’s Essays, Napier, Hughes, and Burke. To which are added 240 Examination questions. Cr. 8vo, cloth, 4s. 6d. [Student’s Manuals.

Gesta Romanorum. Selected and adapted. Plates. Cr. 8vo, cloth gilt, gilt edges, 2s. 6d. [Fairy Library.

Gilbert. Books by William Gilbert:

Modern Wonders of the World, or the New Sindbad. Second Edition. Illustrated by Arthur Hughes. Sm. 8vo, cloth gilt, gilt edges, 3s.

The History of a Huguenot Bible. Second Edition. Illustrated. Sm. 8vo, cloth gilt, gilt edges, 3s.

Goethe. Select Poems of Goethe, edited, with Introductions, Notes, and a Life of Goethe (in German), by Prof. E. A. Sonnenschein, M.A. (Oxon), and Prof. Alois Pogatscher. Second Edition. 12mo, limp cloth, 1s. 6d. [Annotated German Classics.

Gorman, W. Gordon. Converts to Rome: a Classified List of nearly 4,000 Protestants who have recently become converted to the Roman Church. Second Edition much enlarged [1885]. Royal 16mo, cloth extra, gilt top, 2s. 6d.

Gronlund, L. The Co-operative Commonwealth. An Exposition of Modern Socialism. Cr. 8vo, cloth, 2s.; paper, 1s. 6d.

Gray, Peter. Lichens; Mosses, Scale Mosses, and Liverworts; Seaweeds. With cuts, 12mo. [In the press.

Greene, Rev. J. The Insect Hunter’s Companion. Third Edition. Cuts. 12mo, boards, 1s.

Greenwood, James (the “Amateur Casual”). Reminiscences of a Raven. Illustrated. Fcap. 8vo, cloth gilt, 1s.

Grimm, Jacob. Teutonic Mythology, translated by J. Steven Stallybrass. 3 vols. Demy 8vo, cloth, 45s.

Guizot, F. The Devoted Life of Rachel, Lady Russell. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

Gustafsson, Richard. Tea Time Tales for young Little Folks and young Old Folks. Third Edition. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Guyot, Yves. Hon. member of the Cobden Club. Principles of Social Economy. With numerous Diagrams. Demy 8vo, cloth, 9s.

Harley, Rev. Timothy. Moon Lore. Illustrated by facsimiles of old prints and scarce woodblocks. 8vo, cloth extra, gilt top, 7s. 6d.

Harris, Joel Chandler. Uncle Remus. Legends of the Plantations. The Original Illust. Edition. Cr. 8vo, cloth, 2s. 6d.

Harting, J. E. Glimpses of Bird Life. Illustrated with 20 coloured plates by P. Robert. Royal folio, cloth extra, gilt edges, 42s.

Hauff, W. Popular Tales. Translated by Percy E. Pinkerton. New Edition. Cuts. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d. [Fairy Library.

Hawthorne, Nathaniel. Biographical Stories. Portraits. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

Benj. West, Newton, Johnson, Cromwell, B. Franklin, Queen Christina.

Hawthorne, Dr. Robert. The Student’s Manual of Indian History. Cr. 8vo, cloth, 3s. 6d. [Student’s Manuals.

Hehn, Prof. Victor. The Wanderings of Plants and Animals. Edited by J. Steven Stallybrass. Demy 8vo, cloth, 16s.

Hein, Dr. G. A German Copy-Book. 32 pages, each with a separate head-line, 4to, in wrapper, 6d.

Henderson, F. Leslie. Three Plays for Drawing-Room Acting. Cinderella, The Lady-Help, Story of the Stars. Demy 8vo, 1s.

Hewett, H. G. Heroes of Europe. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Hewetson. Works by Dr. H. Bendelack Hewetson:

Life of Robert Hewetson. Illustrated by phototypes. Royal 4to, boards, 42s.

The Influence of Joy upon the Workman and his Work. Illustrated by autotypes. 4to, boards, 3s. 6d.

The Human Eye in Perfection and in Error. Cuts. Demy 8vo, 1s.

Hichens, R. S. The Coastguard’s Secret: a Novel. Cr. 8vo, cloth, 6s.

Higginson, T. Wentworth. Common Sense about Women. Third Edition. Cr. 8vo, cloth boards, 1s.

Hillocks, Rev. J. Inches. Hard Battles for Life and Usefulness. With Introduction by Walter C. Smith, D.D., and photo of the author. Second Edition. Demy 8vo, cloth, 3s. 6d.

Hinton, C. H., B.A. Scientific Romances. 1s. each.

What is the Fourth Dimension?

The Persian King.

Hobson. Works by Mrs. Carey Hobson:

The Farm in the Karoo. Illustrated. Second Edition. Crown 8vo, cloth gilt, gilt edges, 3s. 6d.

At Home in the Transvaal: or, Boers and Boers. 2 vols. Crown 8vo, cloth, 21s.

Howe, Cupples, Master Mariner. The Deserted Ship. A real story of the Atlantic. Illustrated by Townley Green. Fourth Edition. Sm. 8vo, cloth gilt, gilt edges, 2s. 6d.

Hughan, Samuel. Hereditary Peers and Hereditary Paupers: the two extremes of English Society. Paper, 1s.

Imperial Parliament Series. See page 27.

Impey, F. Three Acres and a Cow. With Preface by the Rt. Hon. J. Chamberlain, M.P., and Appendix by the Duke of Argyll. Cr. 8vo, paper, 6d.

Irving, Washington, The Beauties of. With 23 full-page plates by George Cruikshank. Edition de luxe. Imperial 32mo, cloth extra, gilt top, 2s. 6d.

Isocrates’ Evagoras. Edited, with Introduction and Notes for the use of schools, by Henry Clarke, M.A. 12mo, cloth, 2s. 6d.

Jenkins, Edward, M.P. Jobson’s Enemies. With 10 plates by F. Barnard. Cr. 8vo, cloth, 6s.

Jewitt, Llewellynn. Handbook of English Coins. With a Chapter on Greek Coins by Barclay V. Head (Brit. Mus.). Illustrated. Cr. 8vo, cloth, 1s.

Jones, C. A. The Saints of the Prayer-Book. 6 plates, royal 16mo, cloth extra, gilt edges, 2s. 6d.

Jung, Dr. K. Australia and her Colonies. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Karoly, Dr. Akin. The Dilemmas of Labour and Education. Cr. 8vo, cloth, 3s. 6d.

Keene, Katherine. Voiceless Teachers. Cuts. Cr. 8vo, cloth gilt, gilt top, 2s.

Kindergarten Manuals.

Bülow’s Child and Child Nature. 3s.

Bülow’s Handwork and Headwork. 3s.

The Kindergarten: Essays on Principles and Practice [Froebel Society’s Lectures]. 3s.

Kindergarten, The: Essays on Principles and Practice. Being a Selection of Lectures read before the London Froebel Society. Cr. 8vo, cloth, 3s.

Kirby. Works by W. F. Kirby (Brit. Mus.):

Handbook of Entomology. Illustrated with several hundred figures. 8vo, cloth gilt, 15s.

Evolution and Natural Theology. Crown 8vo, cloth, 4s. 6d.

Young Collector’s Handbook of Entomology. Fully Illustrated. Cr. 8vo, cloth, 1s.

Kirton. Books by Dr. J. Kirton:

Happy Homes and How to Make Them. 104th Thousand. Cuts. 12mo, cloth gilt, gilt edges, 2s.

The Priceless Treasure: an Account and History of the Bible. Fourth Edition. Cuts. 12mo, cloth gilt, 2s.

Kroeker, Kate Freiligrath. Alice thro’ the Looking-glass, and three other Plays for Children. Plates. Crown 8vo, cloth gilt, gilt edges, 2s. 6d.

Lamb, Charles and Mary. Mrs. Leicester’s School. Illustrated. New Edition. Fcap. 8vo, cloth gilt, 1s.

Le Free, Richard. The History of a Walking Stick, in Ten Notches. Cr. 8vo, cloth, 6s.

Leith-Adams. Novels by Mrs. Leith-Adams. Cheap editions. Each vol. cr. 8vo, cloth extra, 3s. 6d.

Geoffrey Stirling.

Madelon Lemoine.

Cosmo Gordon. [Shortly.

Lady Deane. [Shortly.

Letters of the Martyrs. Selected and abridged. Portraits. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Letters of Cranmer, Ridley, Hooper, Taylor, Saunders, Philpot, Bradford, Whittell, Careless, Glover, Simson, and others.

Liefde, Jacob de. The Great Dutch Admirals. Fifth Edition. Illustrated by Townley Green. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Heemskerk, Hein, Marten Tromp, De With, De Ruyter, Evertsen, Cornelius Tromp.

Life at Home, at School, and at College. By an Old Etonian. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Little. Works by J. Stanley Little:

South Africa: A Sketch Book of men and manners. 2 vols. Demy 8vo, cloth gilt, gilt top, 21s.

What is Art? Cr. 8vo, cloth, 3s. 6d.

Little, Rev. H. W. A Short History of Russia. Cr. 8vo, paper, 1s.

Locke, John. Essay on the Human Understanding. Book III. (On Words.) Edited by F. Ryland, M.A. Cr. 8vo, cloth, 4s. 6d.

Löfving. Works by Concordia Löfving:

Physical Education, and its place in a rational system of education. Portrait. Cr. 8vo, cloth, 1s. 6d.

A Manual of Gymnastics. [In preparation.

Lorne, Marquis of, K.G., K.T. Imperial Federation. Cr. 8vo, cloth, 1s. [Imp. Parl. Series.

Lubbock, Sir John, Bart., M.P. Representation. Cr. 8vo, cloth, 1s. [Imp. Parl. Series.

Maccall, William. Christian Legends of the Middle Ages. Cr. 8vo, cloth, 3s. 6d.

McAlpine. Works by Professor D. McAlpine:

Life Histories of Plants. With an Introduction to the Comparative Study of Plants and Animals on a Physiological Basis. Illustrated. Roy. 16mo. [In the press.

Handbook of the Diseases of Plants. Illustrated. Demy 8vo. [In preparation.

McCarthy, Sergeant T. A. Quarterstaff: A Practical Manual. With Figures of the Positions. 12mo, boards, 1s.

Maitland, Agnes C. Madge Hilton; or, Left to Themselves. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 2s. 6d.

Malins, J. Shakespearean Temperance Calendar. A Red-line Birthday Book. 16mo, cloth gilt, gilt edges, 2s. 6d.

Malleson, Mrs. Frank. Notes on the Early Training of Children. Cr. 8vo, cloth, 2s. 6d.

Marryat, Florence. Tom Tiddler’s Ground. [In May.

Martineau des Chesney, Baroness. Marquise and Rosette, and the Easter Daisy. Illustrated. Sm. 8vo, cloth gilt, gilt edges, 3s.

Marvin. Works by Charles Marvin:

Reconnoitring Central Asia. Adventures of English and Russian Explorers, Secret Agents and Special Correspondents in the Region between the Caspian and India from 1863 to 1884. With Illustrations and Map. Second Edition. Demy 8vo, cloth gilt, 7s. 6d.

Our Public Offices. Third Edition. Cuts. Cr. 8vo, cloth, 2s.

Matthews, C. Hiawatha, and other Legends from the Wigwams of the Red American Indians. [New Edition in preparation.

Maynard, Rev. A. Happy Wedded Life. New Edition. Plates. 12mo, cloth gilt, 2s.

Meignan, Victor. Over Siberian Snows. Edited by William Conn. With 16 plates. Demy 8vo, cloth gilt, 16s.

Mentone, Guide to. By an Englishman. Folding Map. 12mo, cloth, 1s. 6d.

Miller, Rev. J. R., D.D. The Perfect Home Series. 5 vols., 12mo, cloth gilt, each 6d.

1. The Wedded Life.

2. The Husband’s Part.

3. The Wife’s Part.

4. The Parent’s Part.

5. The Children’s Part.

Milnes. Works by Alfred Milnes, M.A.:

Problems and Exercises in Political Economy. Cr. 8vo, cloth, 4s. 6d. [Student’s Manuals.

Elementary Notions of Logic. Second Edition. Enlarged. 41 cuts. Crown 8vo, cloth, 2s. 6d.

Mongan, Roscoe, B.A. Our Great Military Commanders. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Marlborough—Clive—Wolfe—Wellington—The Crimean War—The Indian Mutiny—Wolseley—Gordon.

Montague, Colonel. Dictionary of British Birds. New Edition. Edited by E. Newman, F.L.S. Demy 8vo, cloth gilt, 7s. 6d.

Monteiro, H. Tales of Old Lusitania, from the Folk Lore of Portugal. Cr. 8vo, cloth gilt, gilt top, 3s. 6d.

Moore. Works by H. Keatley Moore, B.Mus., B.A.:

The Child’s Pianoforte Book. Second Edition. Illustrated by Kate Greenaway and others. Fcap. 4to, cloth gilt, 3s. 6d.

Music in the Kindergarten. 12mo, 4d.

See also Froebel.

Moore, Nina. Manual of Kindergarten Drawing. Plates. 4to, cloth, 3s. 6d.

Müller, Prof. Max. Deutsche Liebe (German Love). Fragments from the Papers of an Alien. Cr. 8vo, vellum, 5s.; cloth gilt, 3s. 6d.

Mulley—Tabram. Songs and Games for Our Little Ones. By Jane Mulley. Music by M. E. Tabram. Second Edition. Cr. 8vo, 1s.

Naegeli—Schwendener. The Microscope: Theory and Practice. By Prof. C. Naegeli and Prof. S. Schwendener. With about 300 woodcuts. Demy 8vo, cloth, 21s. [In the press.

Naturalist’s World, The. An Illustrated Monthly Magazine of Popular Science. 4to, vol. I. [1884], cloth gilt, 3s. [20 pages, Monthly, 2d.

Needlework for Ladies, for Pleasure and Profit. By “Dorinda.” Second Edition. Crown 8vo, boards, 1s. 6d.

New Crusade, A. By Peter the Hermit. Illustrated. 8vo, boards, 2s.

Newman. Works by E. Newman, F.L.S.:

History of British Ferns. Third Edition. Cuts. Demy 8vo, cloth, 18s.

A “People’s Edition” of the same (abridged), containing numerous Figures, is also issued. Fifth Edition. 12mo, cloth, 2s.

See also Montague’s Dictionary of British Birds.

Nicholson, E. Student’s Manual of German Literature. Cr. 8vo, cloth, 3s. 6d. [Student’s Manuals.

Norton. Histories for Children, by Caroline Norton:

History of Greece. For children. 12mo. Illustrated. 1s.

History of Rome. For children. 12mo. Illustrated, 1s.

History of France. For children. 12mo. Illustrated, 1s.

O’Reilly, Mrs. Robert. The Story of Ten Thousand Homes. Second Edition. Illustrated. Sm. 8vo, cloth gilt, gilt edges, 3s.

Orme, Temple (Teacher at University College School). The Rudiments of Chemistry. With several Woodcuts. Cr. 8vo, cloth, 2s. 6d.

Parker, Joseph, D.D. (of the City Temple). Weaver Stephen; or, the Odds and Evens of English Religion. 8vo, cloth, 7s. 6d.

Parker, Hon. Mrs. Adamson. Among the Fairies. Illustrated by Lily Chitty. Cr. 8vo, cloth gilt, gilt edges, 2s. 6d. [Fairy Library.

Paul, Howard. Not too Funny, just Funny Enough! Short Stories, American and Original. Cr. 8vo, boards, 1s.

Percy Reliques. The Reliques of Ancient English Poetry, consisting of Old Heroic Ballads, Songs, and other Pieces. By Thos. Percy, D.D., Bishop of Dromore. Edited, with an Introduction, Notes, and Glossary, by H. B. Wheatley, F.S.A. 3 vols., 8vo, cloth extra, 36s.

Perez, Bernard. The First Three Years of Childhood. With a Preface by Prof. James Sully, M.A. Cr. 8vo, 4s. 6d.

Plautus’ Captivi. Edited, with Introduction, Critical Apparatus and Notes, by Prof. E. A. Sonnenschein, M.A. (Oxon). Demy 8vo, cloth, 6s.

School Edition of the same, with Notes. Third Edition. 3s. 6d.

Pooley—Carnie. The Common-Sense Method of Teaching French. By H. Pooley and K. Carnie. 12mo, cloth. Part I., 1s.; Part II., 1s.; Memory Exercises, 1s. [Other Parts in preparation.

Prantl-Vines. Elementary Text Book of Botany. By Prof. W. Prantl and S. H. Vines, D.Sc., M.A., Fellow and Lecturer of Christ’s College, Cambridge. Fourth Edition [1885]. 275 woodcuts, demy 8vo, cloth, 9s.

Prentice, Ridley. The Musician: A Guide for Pianoforte Students. In six Grades. Grades I.-IV. Roy. 16mo, cloth, each 2s. [Other Grades in preparation.

See also Fillmore’s History of Pianoforte Music.

Ramsay, A., F.G.S. Bibliography, Index and Guide to Climate. Cuts. Demy 8vo, cloth gilt, 16s.

Rathbone and Pell. Local Government and Taxation. By W. Rathbone, M.P., Albert Pell, M.P., and F. C. Montague, M.A. Cr. 8vo, cloth, 1s. [Imp. Parl. Ser.

Rawnsley, Rev. H. R. Christ for To-Day: A Series of International Sermons by Eminent Preachers of the English and American Episcopal Churches. Edited by Rev. H. R. Rawnsley, M.A., Vicar of Keswick. Imp. 16mo, cloth, gilt top, 6s.

Reid. Novels by Capt. Mayne Reid:

The Death Shot. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

The Flag of Distress. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

The Child Wife. Illustrated. Cr. 8vo. [In preparation.

Reynard the Fox. An old story new told. With Kaulbach’s Illustrations. Second Edition. 4to, cloth extra, gilt top, 5s.

Rich, Elihu. History of the War between Germany and France, 1870-71. Fully Illustrated. Imp. 8vo, 21s.

Richard and Williams. Disestablishment. By Henry Richard, M.P., and J. Carvell Williams, M.P. Second Edition. Cr. 8vo, cloth, 1s. [Imp. Parl. Ser.

Richmond, the Rev. Legh. Annals of the Poor. With Memoir of the Author by J. S. Stallybrass. Plates. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

“Robin.” Children’s Books by “Robin:”

The Little Flower Girl, and other Stories, in verse. Illustrated by Ernest Griset. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

Skippo, and other Stories, in prose and verse. Illustrated by Ernest Griset. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

Rogers. Works by Prof. J. E. Thorold Rogers, M.P.:

Six Centuries of Work and Wages: the History of English Labour. Second Edition. In 1 vol., 8vo, cloth, 15s.

Eight Chapters from the History of English Work and Wages, being a reprint of certain chapters of “Six Centuries of Work and Wages.” Crown 8vo, cloth, 3s. 6d.

Ensilage, and its Prospects in English Agriculture. Second Edition. Cuts. Cr. 8vo, limp cloth, 1s.

Rooper. Books by W. and H. Rooper:

An Illustrated Manual of Object Lessons, containing hints for Lessons in Thinking and Speaking, with 20 “blackboard” illustrations. Cr. 8vo, cloth, 3s. 6d.

A Manual of Collective Lessons in Plain Needlework and Knitting. With numerous Plates and Diagrams. Cr. 8vo, cloth, 3s. 6d.

Ross, Ellen (Author of “The Candle Lighted by the Lord”). Dora’s Boy. Fifth Thousand. Illustrated. Small 8vo, cloth gilt, gilt edges, 3s.

Rouse, Lydia L. Sandy’s Faith. A tale of Scottish Life. Illustrated. Second Edition. Fcap. 8vo, cloth gilt, 1s.

Rowe. Tales by Richard Rowe:

Roughing it in Van Diemen’s Land, and Harry Delane. Sm. 8vo, cloth gilt, gilt edges, 3s.

A Haven of Rest, and Dr. Pertwee’s Poor Patients. Sm. 8vo, cloth gilt, gilt edges, 3s.

Rowsell. Books by Mary C. Rowsell:

Sweet Bells Jangled: A Novel. 3 vols. [At press.

Tales of Filial Devotion. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 2s. 6d.

The Spirit of the Giant Mountains. Illustrated. Cr. 8vo, cloth, gilt edges, 2s. 6d. [Fairy Library.

Rye, John, M.A. Kirby in the Dale. A Novel. 3 vols. Cr. 8vo, cloth, 31s. 6d.

Schaible—Althaus. Seeing and Thinking: Elementary Lessons and Exercises, introductory to Grammar, Composition, and Logical Analysis. By C. H. Schaible, M.D., F.C.P., and T. H. Althaus, M.A., Oxon. Second Edition. Cr. 8vo, cloth, 3s. 6d.

Schiller’s Cabal and Love. Translated by T. S. Wilkinson. 12mo, leatherette, 2s. 6d.

Scottish Naturalist, The. Demy 8vo. Quarterly, 1s. 2d.

Scott, Redna. Edith: A novel. 3 vols. Cr. 8vo, 31s. 6d.

Seboth, J. Alpine Plants. Painted from Nature, with descriptive text by A. W. Bennett, M.A., B.Sc. 4 vols. each with 100 coloured plates. Super roy. 16mo, half persian, gilt tops, each 25s.

The whole series (four vols.) in an elegant carved cabinet, £6 6s. nett.

Shakespeare. The Works of William Shakespeare. The Text revised by Rev. Alexander Dyce. In 10 volumes, 8vo, with Life, Portraits, Facsimile of Will, etc. Fifth Edition. Beautifully printed on antique-laid paper, and handsomely bound in cloth extra, gilt top, each vol. 9s. [Vols. I.-VI. ready.

Shakspere. Othello. Edited for School Use, with notes, by Roscoe Mongan, B.A. Royal 16mo, cloth, 2s.

Shakspere, The Life and Times of. Portraits. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

Sherwood’s, Mrs. Juvenile Library. In three series. Cuts. 12mo, cloth gilt, each, 1s.

Shields, Rev. R. J. Knights of the Red Cross: Seven Allegorical Stories. Plates. 12mo, cloth gilt, 1s.

Shilling Gift Books. Illustrated. Fcap. 8vo, cloth, gilt.

Mrs. Leicester’s School. By Charles and Mary Lamb.

Sandy’s Faith. A Tale of Scottish Life. By Lydia L. Rouse.

The Knights of the Red Cross: Seven Allegorical Stories. By the Rev. R. J. Shields.

Crimson Pages. A Tale of the Reformation. By W. Tillotson.

Reminiscences of a Raven. By James Greenwood (the “Amateur Casual”).

Shirreff. Kindergarten Books by Emily A. Shirreff:

The Kindergarten: Principles of Froebel’s System, and their bearing on the Education of Women. Third Edition. Cr. 8vo, cloth, 1s. 4d.

The Kindergarten and the School. 12mo, 3d.

Wasted Forces. 12mo, 3d.

Sime. Novels by William Sime.

The Red Route. 3 vols. 31s. 6d.

Cradle and Spade. 3 v. 31s. 6d.

Sixpenny Gift Books. Illustrated. Demy 32mo, cloth gilt.

1. Little Henry and his Bearer.

2. Cheerful Cherry; or, Make the Best of it.

3. The Basket of Flowers.

4. The Babes in a Basket.

5. The Prince in Disguise.

6. The Wanderer.

7. Little Goody Two-Shoes.

8. Little Dickie: a Simple Story.

9. Three Foolish Little Gnomes.

10. Cat and Dog Stories.

11. Story of Patient Griseldis.

12. Language of Flowers.

Solly, the Rev. Henry. Rehousing of the Industrial Classes, or Village Communities v. Town Rookeries. 16mo, limp cloth, 6d.

Sonnenschein’s Three Shillings and Sixpenny Novels.

Abdy-Williams, E. M. Two Ifs.

Churchill, Mrs. Spencer. Daisy Darling.

Leith-Adams, Mrs. Geoffrey Stirling.

Leith-Adams, Mrs. Madelon Lemoine.

Mayne Reid, Capt. The Death Shot.

Mayne Reid, Capt. The Flag of Distress.

Tytler, C. C. Fraser. Jasmine Leigh.

Tytler, C. C. Fraser. Margaret.

Williams, Sarah (“Sadie”). The Prima Donna.

Sonnenschein—Nesbitt. Arithmetical works by A. Sonnenschein and H. A. Nesbitt, M.A.:

The Science and Art of Arithmetic. Part I., 2s. 6d.; Parts II.-III., 3s. 6d.; Parts I.-III. in one vol., 5s. 6d. Exercises (only), Part I., 1s.; Parts II.-III., 1s. 3d. Answers (complete), 1s. 6d.

ABC of Arithmetic. Teacher’s Book. Part I., 1s.; Part II., 1s. Pupil’s Book (Exerc. only), Part I., 4d.; Part II., 4d.

Ciphering Book. 40 pp. chequered on right-hand page, and ruled on left-hand page for teacher’s remarks. 3s. per doz.

Sonnenschein, A. Foreign Educational Codes relating to Elementary Education, prescribed by Austrian, Belgian, German, Italian, and Swiss Governments, with Introduction and Notes. Cr. 8vo, cloth, 3s. 6d.

Sonnenschein’s Number Pictures. Fourteen folio coloured sheets for teaching the rudiments of number. Fifth Edition. On one roller, 7s. 6d.; on boards varnished, 16s. Descriptive pamphlet, 6d.

Sonnenschein’s Patent Arithmometer. Box a, 5s. 6d.; box b, 4s. 6d.; box c, 20s. Complete set, £1 10s.

Sonnenschein’s Special Merit Readers. Each well and fully illustrated, and strongly bound in cloth. Parts I.-II. at press. Part III. (Standard III.), 1s. Part IV. (Standard IV.), 1s. 4d.

Sonnenschein’s Linear Blackboard (Outline) Maps (rolling up).

England and Wales. 4 ft. 9 in. by 4 ft. 16s.

Europe. 5 ft. 6 in. by 4 ft. 21s.

Two Hemispheres. 5 ft. 6 in. by 4 ft. 21 s. [Shortly.

Others in preparation.

Stafford, Eric. Only a Drop of Water and other tales. Third Edition. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

Stephens, George. Old Norse Fairy Tales. Cuts. Cr. 8vo, cloth gilt, gilt edges, 2s. 6d. [Fairy Library.

Stories of my Pets. Illustrated. Cr. 8vo, cloth, gilt edges, 1s. 6d.

Strong and Meyer. A History of the German Language. By H. A. Strong, Professor of Latin in the Liverpool University College; and Kuno Meyer, Lecturer on Teutonic Languages, Liverpool University College. 8vo, cloth, 6s.

Stubbs. Works by the Rev. Charles W. Stubbs, M.A.:

Christ and Democracy. Cr. 8vo, cloth gilt, 3s. 6d.

The Land and the Labourers. Second edition. Cr. 8vo, 1s.

The Conscience and other Poems. Printed on hand-made paper. 12vo, vellum, 2s. 6d.

Anthology of Christian Morals. [In preparation.

Student’s Manuals.

Hawthorne’s Student’s Manual of Indian History, 3s. 6d.

Milnes’ Problems and Exercises in Political Economy, 4s. 6d.

Nicholson’s Student’s Manual of German Literature, 3s. 6d.

“Oxon’s” Student’s Manual of the Reign of George III., 4s. 6d.

Table Books.

The Graphic Table Book. 1d.; cloth, 2d.

The Eclipse Table Book. 130th thousand, ½d.

Taylor, Jeremy. Selections from the Works of. With a Short Account of the Author and his Writings. 3s. 6d.

Theal, George McCall. Kaffir Folk Lore; with an Introduction on the Mythology, Manners, and Customs of the Kaffirs. Second Edition. Cr. 8vo, cloth gilt, gilt top, 4s. 6d.

Thorn. Coloured books with text by Ismay Thorn:

Harlequin Eggs. A 4to colour-book for children, with 24 pages of pictures by Lily Chitty. Illustrated boards, 2s. 6d.

In and Out. A 4to colour-book for children, with 24 pages of pictures by Lily Chitty. Illustrated boards, 2s. 6d.

Tillotson, W. Crimson Pages: a Story of the Reformation. Plates. 12mo, cloth gilt, 1s.

Time. A Monthly Magazine of Current Topics, Literature and Art. Medium 8vo.

Vols. I.-IX., edited by Edmund Yates. £3.

Vols. X.-XI. (1884), edited by B. Montgomerie Ranking. Each 6s.

New Series, edited by E. M. Abdy-Williams, commencing with January, 1885. Vols. 1-2, each, 7s. 6d. [Monthly, 1s.

Tiny Mite, the Adventures of a Little Girl in Dreamland. With a large number of Illustrations. 4to, cloth, 5s.

Turner, F. C., B.A. A Short History of Art. Illustrated. Demy 8vo, cloth gilt, gilt top, 12s. 6d.

Tytler. Novels by C. C. Fraser Tytler:

Jasmine Leigh. Second Edition, 3s. 6d.

Margaret. Sec. Edition, 3s. 6d.

Jonathan. Sec. Edition. [Shortly.

Tytler, M. Fraser. Tales of many Lands. Illustrated. Sm. 8vo, cloth gilt, gilt edges, 3s.

Valvedre, A. de. Sorrowful yet Lucky. A Novel. 3 vols. Cr. 8vo, cloth, 31s. 6d.

Vernalecken, Th. In the Land of Marvels. Folk tales of Austria and Bohemia. Edited by the Rev. Prof. E. Johnson, M.A. Cr. 8vo, cloth, gilt top, 5s.

Vicary, J. Fulford, J.P. Readings from the Dane: Short Stories translated from contemporary Danish writers. Cr. 8vo, paper, 1s.

Villari, Lina. Life in a Cave. Frontispiece. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

Vines, S. H., D.Sc, M.A. A School Botany. [In preparation.

See also Prantl-Vines.

Wägner. Works by Dr. W. Wägner:

Asgard and the Gods. A Manual of Norse Mythology. Third Edition. Illustrated. Demy 8vo, 7s. 6d.

Epics and Romances of the Middle Ages. Second Edition. Illustrated. Demy 8vo, 7s. 6d.

Wallace, Cornelia. Flowers, a fantasy. With miniature illustrations. Demy 32mo, cloth gilt, gilt edges, 6d.

Wallis. Novels by A. S. C. Wallis:

In Troubled Times. A Novel. Translated from the Dutch by E. J. Irving. Third Edition (re-translated). Cr. 8vo, 6s.

Royal Favour. A novel. Translated from the Dutch by E. J. Irving. Second edition. Cr. 8vo, cloth, 6s.

“Wanderer” (Author of “Fair Diana,” “Across Country,” etc.). Glamour: a Novel. 3 vols. Cr. 8vo, 31s. 6d.

Weir. Works by Archibald Weir, B.A.:

The Historical Basis of Europe. 8vo. [Shortly.

The Critical Philosophy of Kant. Cr. 8vo, 2s. 6d.

Welby, S. E. The Traveller’s Practical Guide. In four languages. A waistcoat pocket volume. Cloth, 1s.; roan, 1s. 6d.

What the Boy thought. A social satire. Sixth thousand. Roy. 16mo, parchment wrappers, 6d.

White. Books by F. A. White, B.A.:

An Unconventional English Grammar. Second Edition. 12mo, cloth, 4s.

The Boys of Raby. A holiday book for boys. Illustrated by J. Dinsdale. Cr. 8vo, cloth gilt, gilt edges, 2s. 6d.

Wiebe, Prof. E. The Paradise of Childhood: A complete manual of Kindergarten instruction. Third Edition. 75 plates. 4to, cloth, 10s. 6d.

Williams, Sarah (“Sadie”). The Prima Donna. A Novel. 1 vol. edition. Cr. 8vo, cloth, 3s. 6d.

Wilson, Rev. John M. Nature, Man, and God. Contributions to the Scientific Teaching of To-day. Cr. 8vo, cloth, 5s.

Wood, Rev. H. A Season among the Wild Flowers. Second Edition. Cuts. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Wright, Dr. Alfred. Adventures in Servia: Experiences of a Medical free-lance among the Bashi-Bazoucs, etc. Edited and illustrated by E. Farquhar-Bernard, M.R.C.S. (late Surgeon of the Servian Army). Demy 8vo, cloth gilt, 10s. 6d.

Wurtz, Dr. A. The Elements of Modern Chemistry. Cuts. Cr. 8vo, cloth, 10s. 6d.

Xenophon. The Hiero. Edited, with Introduction and Notes for the use of schools, by R. Shindler, M.A. Interleaved. 12mo, cloth, 2s. 6d.

Yonge. Biographical Books by Professor C. D. Yonge:

The Seven Heroines of Christendom. Third Edition. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Our Great Naval Commanders. Illustrated. Cr. 8vo, cloth gilt, gilt edges, 3s. 6d.

Drake—Blake—Cook—Rodney—Nelson—Parry.

Youthful Nobility. Plates. Cr. 8vo, cloth gilt, gilt edges. 1s. 6d.

Zacher, Dr. B. (Assessor to the Prussian Government). The Red International: An Account of Modern Socialism in Germany, France, Great Britain, Ireland, Switzerland, Belgium, Holland, Denmark, Scandinavia, Spain, Portugal, Italy, Austria, Russia, and North America. Translated by the Rev. E. M. Geldart, M.A. Cr. 8vo, paper, 1s.

Zimmern, Helen. Tales from the Edda. Illustrated by Kate Greenaway and others. Cr. 8vo, cloth gilt, gilt edges, 1s. 6d.

The Imperial Parliament Series.

Written entirely by Members of Parliament. Edited by Sydney Buxton, M.P.

In Uniform Crown 8vo Volumes, red cloth, neat, each about 150 pp. 1s.

1. Marq. of Lorne. Imperial Federation.

2. Sir J. Lubbock. Representation.

3. W. Rathbone, Alb. Pell, and F. C. Montague. Local Government and Taxation.

4. Rt. Hon. W. E. Baxter. England and Russia in Asia.

5. Mrs. Ashton Dilke and W. Woodall. Women Franchise.

6. W. S. Caine, W. Hoyle, and Rev. Dawson Burns. Local Option.

7. Henry Broadhurst and R. T. Reid. Leasehold Enfranchisement.

8. Henry Richard and Carvell Williams. Disestablishment.

9. J. Bryce. The House of Lords.

10. J. F. B. Firth. London Government and City Guilds.

The last two not yet ready. Others to follow.

Historical, Political and Social Science.

Daly’s Radical pioneers, 6s.

Gronlund’s Co-op. commonwealth, 2s.

Guyot’s Social economy, 9s.

Higginson’s Common sense about women, 1s.

Hughan’s Hereditary peers and hereditary paupers, 1s.

Imperial Parliament Series, p. 27.

Karoly’s Dilemmas of labour, etc., 3s. 6d.

Milnes’ Political economy, 4s. 6d.

Rogers’ Six centuries of work and wages, 15s.

Rogers’ Eight chapters from the history of English work and wages, 3s. 6d.

Solly’s Rehousing the poor, 6d.

Stubbs’ Christ and democracy, 3s. 6d.

Stubbs’ Land and the labourers, 3s. 6d.

Zacher’s Red international, 1s.

Agriculture, etc.

Chitty’s Beekeeping.

Edwards’ Rabbits, 2s. 6d.

Ewing’s Agriculture, 6d.

Fawkes’ Horticultural buildings, 3s. 6d.

Fawkes’ Hot water heating, 1s.

Rogers’ Ensilage, 1s.

Natural History and Science.

“Alert,” Cruise of the, by Coppinger, 6s.

Allen’s (Grant) The Evolution of Flowers.

Alpine Plants, 400 coloured plates, 4 vols., £5. In Cabinet, £6 6s.

Bennett’s Flora of Alps, 5s.

Bevan’s Royal Relief Atlas, 21s.

Claus-Sedgwick’s Text-book of zoology, Vol. I., 21s.; Vol. II., 16s.

Cox’s Little cyclopædia of common things, 7s. 6d.

Espin’s Star atlas, 1s. 6d.

Friend’s Flowers and flower-lore, 7s. 6d.

Harting’s Glimpses of bird life, 42s.

Hehn’s Wanderings of plants, 16s.

Hewetson’s The human eye, 1s.

Kirby’s Handbook of entomology, 15s.

Kirby’s Evolution and nat. theology, 4s. 6d.

McAlpine’s Diseases of plants.

McAlpine’s Life histories of plants.

Montague’s Dictionary of British birds, 7s. 6d.

Naegeli-Schwendener’s The microscope, 21s.

Newman’s History of British ferns, 18s.

Prantl-Vines’ Text-book of botany, 9s.

Ramsay’s Bibliography of climate, 16s.

Wurtz’s Elements of modern chemistry, 10s. 6d.

Popular Science.

Armstrong’s Birds and their ways, 1s. 6d.

Bagnall’s Mosses, 1s.

Bottone’s The dynamo, 2s. 6d.

Butler’s Entomology of a pond.

Greene’s Insect hunter’s companion, 1s.

Clement’s Geological systems, 1s.

Kirby’s Young collector, 1s.

Newman’s Ferns, People’s edition, 2s.

Pilter’s Human physiology, 1s.

Wood’s Season among wild flowers, 2s. 6d.

Young Collector’s Penny handbooks, 8 vols., 1d. each.

Natural History Magazines.

The Naturalist’s World. Monthly, 2d.

The Scottish Naturalist, quart., 1s.

Books of Travel, etc.

“Alert,” Cruise of H.M.S. Alert, 6s.

Barras’ India, 4 vols., each 3s. 6d.

Forbes’ Canara and Ganjam, 6s.

Hobson’s The farm in the Karoo, 3s. 6d.

Little’s South African sketch book, 2 vols., 21s.

Marryat’s Tom Tiddler’s ground.

Marvin’s Reconnoitring Central Asia, 7s. 6d.

Meignan’s Over Siberian Snows, 16s.

Wright’s Adventures in Servia, 10s. 6d.

Novels and Minor Fiction.

Abdy-Williams’ Two Ifs, 3s. 6d.

Abdy-Williams’ For his friend, 3 v., 31s. 6d.

Abdy-Williams’ Forewarned, 1s.

Auerbach’s Two stories, 2s. 6d.

Babcock’s Cypress Beach, 2 vols., 12s.

Bickerdyke’s With the best intentions, 2s. 6d.

Boger’s Elfrica, 3 vols., 31s. 6d.

Bradshaw’s Roger North, 3 vols., 31s. 6d.

Burke’s Couleur de rose, 2 vols., 21s.

Churchill’s Daisy Darling. 3s. 6d.

Corbett’s Cassandra, 3 vols., 31s. 6d.

Dalton’s False steps, 1s.

Douglas’ Measure for measures 2 vols., 21s.

Evelac’s Leaven of malice, 6s.

Hichens’ Coastguard’s secret, 6s.

LeFree’s Walking stick, 6s.

Hobson’s At home in the Transvaal, 2 vols., 21s.

Leith-Adams’ (Mrs.) Geoffrey Stirling, 3s. 6d.

Leith-Adams’ Madelon Lemoine, 3s. 6d.

Mayne Reid, The Death Shot, 3s. 6d.

Mayne Reid, The Flag of Distress, 3s. 6d.

Müller’s German love, 3s. 6d. and 5s.

Parker, Dr. J. Weaver Stephen, 7s. 6d.

Paul’s Not too funny! 1s.

Rowsell’s Sweet bells jangled, 3 vols.

Rye’s Kirby in the dale, 3 vols., 31s. 6d.

Scott’s (Redna) Edith, 3 vols., 31s. 6d.

Sime’s The red route, 3 vols., 31s. 6d.

Tytler’s Jasmine Leigh, 3s. 6d.

Tytler’s Margaret, 3s. 6d.

Valvedre’s Sorrowful yet lucky, 31s. 6d.

Vicary’s Reading from the Dane, 1s.

Wallis’ In troubled times, 6s.

Wallis’ Royal favour, 6s.

“Wanderer’s” Glamour, 3 vols., 31s. 6d.

Williams’ (S.) Prima donna, 3s. 6d.

Antiquities, Folk-lore, etc.

Axon’s Gipsy folk tales.

Bowker’s Goblin tales of Lancs., 2s. 6d.

Caballero’s Book of Spanish tales, 2s. 6d.

Cappel’s Old Norse sagas, 2s. 6d.

Croker’s Irish fairy legends.

Friend’s Flowers and flower-lore, 7s. 6d.

Fryer’s English fairy tales, 2s. 6d.

Geldart’s Modern Greek folk-lore, 2s. 6d.

Gesta Romanorum, 2s. 6d.

Grimm’s Teutonic mythology, 3 vols., 45s.

Harley’s Moon lore, 7s. 6d.

Harris’ Uncle Remus, 2s. 6d.

Hehn’s Wanderings of plants, 16s.

Maccall’s Christian legends, 3s. 6d.

Matthews’ Legends of the wigwams.

Monteiro’s Portuguese folk-lore, 3s. 6d.

Percy Reliques, 3 vols., 31s. 6d.

Rowsell’s The Spirit of the Giant mountains, 2s. 6d.

Stephens’ Old Norse fairy tales, 2s. 6d.

Theal’s Kaffir folk-lore, 4s. 6d.

Vernalecken’s In the land of marvels, 5s.

Wägner’s Asgard and the gods, 7s. 6d.

Wägner’s Epics and romances, 7s. 6d.

Zimmern’s Tales from the Edda, 1s. 6d.

Theological and Devotional Books.

Adams’ My man and I, 7s. 6d.

Church Rambles and Scrambles, 2s.

Cockburn, Laws of nature, 3s. 6d.

Contemporary Pulpit. Vols. I.-IV., each, 6s. Monthly, 6d.

Dover’s Lent manual, 2s. 6d. and 1s. 6d.

Dover’s Ministery of mercy, 6s.

Fuller’s Holy and profane states, 3s. 6d.

Fuller’s Life of Fuller. 2 vol., 12s.

Geldart’s Sunday for our little ones, 3s.

Geldart’s Doctrine of atonement, 3s. 6d.

Gorman’s Converts to Rome, 2s. 6d.

Kirby’s Evolution and nat. theol., 4s. 6d.

Maccall’s Christian legends, 3s. 6d.

Miller’s The perfect home. 5 vols., ea. 6d.

Rawnsley’s Christ for to-day, 6s.

Richard and Williams’ Disestablishment, 1s.

Stubbs’ Christ and democracy, 3s. 6d.

Stubbs’ Anthology of Christian morals.

Taylor, Jeremy, Selections from, 3s. 6d.

Wilson’s The Supreme Power.

Temperance and Cottage Books.

Arthur’s Ten nights, 2s.

Eclipse Elocutionist, 1s.

Kirton’s Happy homes, 2s.

Kirton’s Priceless treasure, 2s.

Malin’s Shakespeare temp, cal., 2s. 6d.

Maynard’s Happy wedded life, 2s.

Miller’s The perfect home. 5 vols., each 6d.

Prize Pictorial Readings, 2s.

Rainbow Readings, 1s.

Sixpenny Series.

Wheeler’s Drops of water, 1s.

Books on and of Music.

Andersen’s Fairy tales set to music, 1s. 6d.

Bourne’s Great composers, 3s. 6d.

Fillmore’s Hist. of pianoforte music, 3s. 6d.

Moore’s Child’s pianoforte book, 3s. 6d.

Moore’s Music in the K. G., 4d.

Mulley’s Songs and games, 1s.

Pagi’s Number notation, 1s. 6d.

Prentice’s Musician, Grades I.-IV., 2s. each.

Books on the Fine Arts, etc.

Alpine Plants, 4 vols., each 25s.

Everitt’s English caricaturists, 42s.

Harting’s Glimpses of bird life, 42s.

Hewetson’s Life of Hewetson, 42s.

Hewetson’s Influence of joy, 3s. 6d.

Irving (Wash.), Beauties of. 23 plates by G. Cruikshank, 2s. 6d.

Little’s What is art? 3s. 6d.

Turner’s Short history of art, 12s. 6d.

Kindergarten Books.

Buckland’s Happiness of childhood, 6d.

Buckland’s Use of stories, 3d.

Bülow’s Child nature, 3s.

Bülow’s Hand-work and head-work, 3s.

DePortugall’s Synoptical table, 2s. 6d.

Froebel, Selections from.

Heerwart’s Mutterlieder, 3d.

Kindergarten, The. Essays, etc., 3s.

Moore’s (H.K.) Child’s pianof. book, 3s. 6d.

Moore’s (H.K.) Music in the K.G., 4d.

Moore’s (N.) Kindergarten drawing, 3s. 6d.

Mulley’s Songs and games, 1s.

Shirreff’s The Kindergarten, 1s. 4d.

Shirreff’s Wasted forces, 3d.

Shirreff’s The Kinderg. and the School, 3d.

Wiebe’s Paradise of childhood, 10s. 6d.

Books on Education.

Buxton’s Overpressure, 2s. and 1s.

Cooper’s Training of the memory, 3d.

Crawford’s Reform of spelling, 6d.

Fawkes’ Babies; how to rear them, 6d.

Hoggan’s Physical education of girls, 4d.

Karoly’s Dilemmas of labour and education, 3s. 6d.

Kindergarten Books. See special heading above.

Locke “On words,” ed. Ryland, 4s. 6d.

Löfving’s Physical education, 1s. 6d.

Löfving’s Manual of gymnastics.

McCarthy’s Government code, 6d.

Malleson’s Early training of children, 2s. 6d.

Moore’s Selections from Froebel.

Nicholson’s Student’s manual of German literature, 3s. 6d.

Perez’s First three years of childhood, 4s. 6d.

Sonnenschein’s Foreign educational codes, 3s. 6d.

School and College Books, etc.

Bevan’s Royal relief atlas, 21s.

Bevan’s Home geography.

Brant’s Systematic cutting out, 2s.

Claus-Sedgwick. Elem. Text-book of Zoology, 21s. and 16s.

Edwards’ Mental calculator, 1s.

Faithfull’s Century cards.

Fleay’s Logical English grammar, 2s.

Fowle’s Short and easy Latin book, 1s. 6d.

Fowle’s First easy Latin reader, 3s. 6d.

Fowle’s Second easy Latin reader, 3s. 6d.

Fowle’s Short and easy Greek book, 2s. 6d.

Fowle’s First easy Greek reader, 5s.

Fowle’s Second easy Greek reader, 5s.

Fowle’s First Greek reader for Eton, 1s. 6d.

Fowle’s First book of Homer’s Iliad, 2s.

Fowle’s Selections fr. Lat. authors, 2s. 6d. and 1s. 6d.

Geometry, Plane, Elements of, 3s. 6d.

George II., 3s.

George III., 4s. 6d.

Goethe, Select poems of, 1s. 6d.

Hawthorne’s Manual of Indian history, 3s. 6d.

Hein’s German copy book, 6d.

Isocrates, Evagoras, ed. Clarke, 2s. 6d.

Limerick, Bishop of. Geomet. models.

Milnes’ Political economy, 4s. 6d.

Milnes’ Elementary notions of logic, 2s. 6d.

Moore’s Child’s pianoforte book, 3s. 6d.

Norton’s Histories, 3 vols., 1s. each.

Orme’s Chemistry, 2s. 6d.

Pilter’s Human physiology, 1s.

Plautus, The captivi, 6s., 3s. 6d.

Pooley-Carnie’s Com. sense French, 1s.

Prantl-Vines’ Text-book of botany, 9s.

Prentice’s Musician. Grds. I.-IV. ea. 2s.

Rooper’s Manual of object lessons, 3s. 6d.

Rooper’s Needlework and knitting, 3s. 6d.

Schaible-Althaus’ Seeing and thinking, 3s. 6d.

Shakspere’s Othello, for school use, 2s.

Sonnenschein’s—

Number pictures, 7s. 6d. and 16s.

Blackboard maps, 16s. and 21s.

Patent arithmometer, 5s. 6d., 4s. 6d., and 30s.

Special merit readers, 1s. and 1s. 4d.

Science and art of arithmetic, 2s. 6d., etc.

A B C of Arithmetic, 1s., etc.

Ciphering book, 3s. per dozen.

Strong’s History of German Lang., 6s.

Student’s Manuals.

Table Books, ½d. and 1d.

Vines’ School botany.

White’s Unconventional Engl. gram., 4s.

Xenophon’s Hiero, ed. Shindler, 2s. 6d.

The Cambridge Examiner, Monthly 6d.

Miscellaneous and Reference Books.

Best Books, The, a classified Bibliography.

Bevan’s Guide to Westminster Abbey.

Bevan’s Guide to Lichfield Cathedral.

Cox’s Little cyclopædia of common things, 7s. 6d.

Jewitt’s English Coins, 1s.

McCarthy’s Quarterstaff, 1s.

Marvin’s Our public offices, 2s.

Mentone, Guide to, 1s. 6d.

Welby’s Traveller’s pract. guide, 1s.

What the boy thought, 6d.

GIFT AND PRIZE BOOKS.

Book at £6 6s. (nett.)

Seboth and Bennett’s Alpine plants. 4 series, in cabinet.

Books at £1 1s.

Bevan’s Royal Relief Atlas.

Rich’s The war between Germany and France 1870-71.

Gift Books at 7s. 6d.

Adams’ Book of earnest lives.

Adams’ Battle stories.

Adams’ Girlhood of remarkable women.

Cox’s Little cyclopædia of common things.

Friend’s Flowers and flower-lore.

Gems from the Poets.

Wägner’s Asgard and the gods.

Wägner’s Epics and romances of the Middle Ages.

Gift Book at 6s.

Alert. Cruise of the Alert, by Coppinger.

Gift Books at 5s.

Müller’s (Max), German Love, vellum.

Reynard the Fox.

Vernalecken’s In the land of marvels.

Gift Books at 3s. 6d.

Adams’ Celebrated women travellers.

Alberg’s Gustavus Vasa.

Arabian Nights, the new.

Birthday Book, Floral.

Bourne’s The great composers.

Bourne’s African heroes. 2 series.

Chapman’s Notable women of the Reformation.

Chapman’s Notable women of the Puritan times.

Clarke’s Book of Golden Friendships.

Cooke’s Three great lives.

Darton’s Brave boys.

Darton’s Famous girls.

Fuller’s Holy and profane states.

Gustafsson, Tea-time tales.

Hauff’s Popular Tales.

Hewett’s Heroes of Europe.

Hillocks’ Hard battles.

Hobson’s The farm in the Karoo.

Jung’s Australia and her colonies.

Letters of the Martyrs.

Liefde’s Great Dutch admirals.

Life at home, at school, and at college.

Moore’s Child’s pianoforte book.

Mongan’s Our great military commanders.

Müller’s (Max) German love.

Reid’s (Mayne) The death shot.

Reid’s The flag of distress.

Taylor (Jeremy), Selections from.

Yonge’s Seven heroines of Christendom.

Yonge’s Our great naval commanders.

Gift Books at 3s.

Children’s Journey, the.

Gilbert’s Modern wonders of the world.

Gilbert’s History of a Huguenot Bible.

Keene’s Voiceless Teachers.

Martineau des Chesney’s Marquise and Rosette.

O’Reilly’s Story of ten thousand homes.

Rowe’s Roughing it in Van Diemen’s Land.

Rowe’s A haven of rest.

Ross’ Dora’s boy.

Tytler’s Tales of many lands.

Gift Books at 2s. 6d.

Auerbach’s Two stories.

Austin’s Moon folk.

Bowker’s Goblin tales of Lancashire.

Bickerdyke’s With the best intentions.

Caballero’s Book of Spanish tales.

Camden’s Hoity Toity.

Camden’s Travelling Menagerie.

Cappel’s Old Norse sagas.

Chapman’s Notable Women of the Covenant.

Clarke’s George and Robert Stephenson.

Cupples’ Tappy’s chicks.

Fryer’s Book of English fairy tales.

Geldart’s Modern Greek folk-lore.

Harris’ Uncle Remus. Illust. Edition.

Howe’s The deserted ship.

Irving (W.) Beauties of. 23 plates by G. C.

Kroeker’s Alice thro’ the looking-glass.

Maitland’s Madge Hilton.

Parker’s Among the Fairies.

Rowsell’s Tales of filial devotion.

Rowsell’s Spirit of giant mountains.

Stephens’ Old Norse fairy tales.

Thorn’s Harlequin eggs; In and Out.

White’s Boys of Raby.

Wood’s Season among the wild flowers.

Gift Books at 1s. 6d.

Alberg’s Charles XII.

Andersen’s Fairy tales set to music.

Armstrong’s Birds and their ways.

Baker’s Stories of olden times.

Bickerdyke’s An Irish midsummer night’s dream.

Bourne’s Life of Gustavus Adolphus.

Chapman’s Life of John Wiclif.

Chapman’s Life of Martin Luther.

Clarke’s Short biographies—

Prince Consort.

Charlemagne.

Sir W. Raleigh.

George Stephenson.

Robert Stephenson.

William Tyndale.

Cobbe’s Doll stories.

Cooke’s A boy’s ideal.

Cooke’s True to himself.

Cooke’s Latimer’s candle.

Cooke’s English Hero.

Gausseu’s Iron Kingdom.

Gausseu’s King’s Dream.

Gausseu’s Kingdom of Iron and Clay.

Guizot’s Life of Lady Russell.

Hawthorne’s Biographical stories.

Richmond’s Annals of the poor.

“Robin’s” The little flower-girl.

“Robin’s” Skippo.

Shakspere, his life and times.

Stafford’s Only a drop of water.

Stories of my Pets.

Villari’s Life in a cave.

Zimmern’s Tales from the Edda.

Gift Books at 1s.

Greenwood’s Reminiscences of a raven.

Lamb’s Mrs. Leicester’s school.

Norton’s History of Greece for children.

Norton’s History of Rome for children.

Norton’s History of France for children.

Rouse’s Sandy’s faith.

Sherwood’s Juvenile library. 3 vols.

Shield’s Knights of the red cross.

Tillotson’s Crimson pages.

Gift Books at 6d.

Anson’s Cat and dog stories.

Anson’s Three foolish little gnomes.

Chapman’s The wanderer.

Cheerful Cherry; or, make the best of it.

Little Dickie.

Little Goody Two-shoes.

Little Henry and his bearer.

The Babes in a basket.

The Basket of flowers.

The Language and sentiment of flowers.

The Prince in disguise.

The Story of patient Griseldis.

The Perfect home series. By Rev. Dr. Miller. 5 vols., each 6d.

Wallace’s Flowers.

MAGAZINES.

TIME. 128 pages, medium 8vo. Monthly. From 1885, 1s.

THE CONTEMPORARY PULPIT. 64 pages, roy. 16mo. Monthly, 6d.

EASTWARD HO! 96 pages. Monthly, 6d.

THE CAMBRIDGE EXAMINER. A Monthly Educational Journal (except July and August). 48 pages, demy 8vo. Monthly, 6d.

THE NATURALIST’S WORLD. Illustrated. 20 pages, fcap. 4to. Monthly, 2d.

THE SCOTTISH NATURALIST. Demy 8vo. Quarterly, 1s. 2d.

Printed by Hazell, Watson, & Viney, Ld., London and Aylesbury.

*** END OF THE PROJECT GUTENBERG EBOOK SELECTED LIST OF SWAN SONNENSCHEIN & CO.'S PUBLICATIONS ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

Table of Contents

- [Pg 2]
- [Pg 3]
- [Pg 4]
- [Pg 5]
- [Pg 6]
- [Pg 7]
- [Pg 8]
- [Pg 9]
- [Pg 10]
- [Pg 11]
- [Pg 12]
- [Pg 13]
- [Pg 14]
- [Pg 15]
- [Pg 16]
- [Pg 17]
- [Pg 18]
- [Pg 19]
- [Pg 20]
- [Pg 21]
- [Pg 22]
- [Pg 23]
- [Pg 24]
- [Pg 25]
- [Pg 26]
- [Pg 27]
- [Pg 28]
- [Pg 29]
- [Pg 30]
- [Pg 31]
- [Pg 32]
- THE FULL PROJECT GUTENBERG LICENSE