On building a theatre / Stage construction and equipment for small theatres, schools and community
Date: 2022-04-02T00:00:00+00:00
Keywords: Theater architecture

The Project Gutenberg eBook of On building a theatre

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: On building a theatre

Author: Irving Pichel

Release date: April 1, 2022 [eBook #67752]
Most recently updated: October 18, 2024

Language: English

Original publication: United States: Theatre Arts Inc, 1920

Credits: Alan, Charlene Taylor and the Online Distributed Proofreading Team at https://www.pgdp.net (This file was produced from images generously made available by The Internet Archive/American Libraries.)

*** START OF THE PROJECT GUTENBERG EBOOK ON BUILDING A THEATRE ***

THEATRE ARTS MONOGRAPHS. No. 1

Façade and entrance of the Beechwood Theatre and
Scarborough School, Scarborough, New York. Welles
Bosworth, Architect. (Photograph by Arnold Genthe.)

ON BUILDING A
THEATRE

STAGE CONSTRUCTION AND EQUIPMENT
FOR SMALL THEATRES, SCHOOLS
AND COMMUNITY BUILDINGS

BY

IRVING PICHEL

NEW YORK
THEATRE ARTS Inc.
1920

Copyright 1920 by Theatre Arts, Inc.

CONTENTS

| Introduction

I.

Architectural Tradition in the Theatre:
The Auditorium

II. | The Stage Plan
III. | Provision for Back-stage Workers
IV. | The Equipment of the Stage
V. | Stage Lighting
VI. | Stage Machinery and Settings
| Bibliography

LIST OF ILLUSTRATIONS

Entrance of the Beechwood Theatre | Frontispiece
Stage of the Teatro Farnese at Parma | 15
Sketch of an Elizabethan Theatre | 16
Interior of the Little Theatre, New York | 25
Exterior of the Little Theatre, New York | 26
The Munich Art Theatre | 39
Exterior of the Munich Art Theatre | 40
Section of the Munich Art Theatre | 41
Auditorium of the Munich Art Theatre | 42
The Arts and Crafts Theatre, Detroit | 55
The Carnegie Institute Theatre, Pittsburgh | 56
The Neighborhood Playhouse, New York | 65
The Artist’s Guild Theatre, St. Louis | 66
Illustrations in the Text— |

1. | Plan of the Teatro Olympico at Vicenza | 19
2. | Plans of the Berlin Volksbühne | 20
3. | Plan and section of the Little Theatre, New York | 22
4. | Plan of the Carnegie Institute Theatre, Pittsburgh | 28
5. | First-floor plan of the Munich Art Theatre | 30
6. | Second-floor plan and section of the Munich Art Theatre | 31
7. | Plan of the 39th Street Theatre, New York | 35
8. | Plan of the Beechwood Theatre | 37
9. | Stage of the Théâtre du Vieux Colombier | 71

INTRODUCTION

Architectural ineptitudes are more likely to be perpetuated and in time condoned than those in any other art. Generally speaking, a bad painting is scrapped, poor music remains unpublished and unplayed (along with much good music, no doubt), and bad books, after a time, cease to be read. But a building is somehow inescapable. Having a durability that needs no treasuring, and being erected more often for use than for beauty, a building generally achieves longevity, and the bad art crumbles no sooner than the good stone. Usefulness, great initial cost, sturdy stuff, are all against a building’s being put out of the way merely because it is ugly. Or even, as a matter of fact, because it does not successfully serve the purpose for which it was erected.

As people live in a house, or work, day after day, in a store or factory or public building, they become used to inconveniences, bad arrangement, and lack of proper facilities. They complain for a time, perhaps, and then forget. And after a while, when the house has become home, or the large building has gathered tradition, a sort of admiration settles upon it. What is really plain ugly or wrong or bad appears quaint and full of “atmosphere.” And is imitated. Style and tradition embalm the very features that make the building a bad building.

In the theatre, this perpetuation of musty, tradition-hallowed faults of construction has been carried to an extraordinary extreme. There is more ritual, one might believe, in constructing a stage and auditorium in accordance with honored custom than there is in the building of a church. In the more modern theatres, there have been notable improvements over the theatres of a generation ago; but in the auditoriums and stages of schools, clubs and societies, and in other public or semi-public buildings in which such facilities are included as a sort of side issue, the ancient law is observed. The average high school stage seems to be inspired by the faint recollection of a visit to the theatre, supplemented by the examination of old prints illustrating the stage of Inigo Jones.

******

To-day, by a concerted movement throughout the country, hundreds of community houses are being planned as war memorials. These buildings are designed to include facilities for all the social and recreational interests of the communities they will serve. Practically all of them will include stages and auditoriums. At the same time, hundreds of new school buildings are being planned, and these, too, will have stages intended to be useful for dramatic productions. But unless architects have at their disposal much more technical knowledge of the producers’ requirements than in the past, it is certain that most of these auditoriums and stages will be bad—as are the auditoriums and stages in most existing schools. It is to forestall some of the common mistakes that this paper has been prepared—to describe them in detail, and to set up against them the ideal features toward which the designers of such structures should strive.

I believe that the memorial halls are destined to play so large a part in community life that they must have removed from them every obstacle to their fullest usefulness. In every community of moderate size and culture there is a releasing to-day of dramatic impulse, and folks turn more and more toward the theatre as a mode of group expression. The Little Theatre movement, with its eighty-five or more centers renewing their life, now that the war is over, is an evidence of the birth of a new theatre in this country. Innumerable community pageants and masques are an indication that people turn to the drama as a means of expressing their corporate æsthetic. The production of worthy plays by schools and colleges, the interest such institutions are showing in the writing of plays and in the fostering of an indigenous drama, the widespread discussion of the drama and the theatre by clubs, reading circles and drama leagues, all are portents of a theatre that shall be a vital and integral part of our daily community life. And at the very moment these words are being written, the commercial theatre that has so long held the arena is being convulsed by a revolution that may mean nothing short of its eventual extinction. The system of wholesale manufacture and distribution of theatre products is on the wane, and the theatre as an art, as a social institution of the rank and significance of the school or the church, may soon have the field to itself. Hourly, in the little theatres, in community drama undertakings, in the municipal theatres, in the classrooms and the clubs, and on the school stages, the new theatre is growing up.

One of the finest services that the memorial community house can render is to provide a home for the dramatic impulse of the community—not a makeshift home, but one worthy of the fine art of the drama and the fine craft of the theatre. It does not matter whether or not the building is to be large and pretentious or small and inexpensive; but it matters that it should be fitted to the least detail to fulfill its function efficiently and beautifully.

I do not write these pages as an architect or as an instructor of architects, but as one knowing fairly well the conditions which a stage has to meet when it is used for dramatic representations of any sort. In the course of a rather varied experience in the theatre—amateur and professional, little and big, commercial and “art”—I have encountered practically all the mistakes that are made in stage construction. I have found them to be of two sorts: mistakes of imitation, and mistakes of ingenuity.

The first type of mistake is easy enough to account for. Usually, the auditoriums and stages of schools have been intended primarily for use as “chapels” or assembly halls. There has been a feeling on the part of school authorities that the dramatic instinct is in some way unwholesome and that its expression should be discouraged. As often as not the design of the school stage has been a conspiracy to thwart its growth. The attitude of the authorities has recently changed somewhat, but with the change has come very little more intelligence in the matter. Where, before, they were careful to obstruct, they are now merely negligent, leaving the architect to his own devices. The proceeding is very much at random, and experts are rarely consulted. It is not wholly the architect’s fault that he builds as he does. Opportunities to build stages are not frequent; he knows more about building them than using them, and the models he follows have not been often enough refreshed by the innovations of theatre experts. His patterns are largely outmoded. In the largest high school in one of the greatest midwestern cities, I have seen a stage built no more than five years ago in which is exemplified almost every stage feature of the civil war period—a vast curved apron, grooves for wings, and a stage floor sloping from the back wall toward the footlights. In addition, there are one or two mistakes peculiar to high schools,—notably the omission of an entrance to the stage, save on one side.

The other type of error which one encounters is usually made by a clever man who has observed the more modern practices in building large theatres and attempts to adapt them to a space utterly inadequate or wrongly shaped for the purpose. Usually he cramps his space hopelessly and renders it even less useful for its purpose than it might have been had no such ingenuity been displayed. The finely equipped stage of the Artists’ Guild Theatre in St. Louis is an admirable replica in little of a fully equipped stage of the commercial theatre. But the stagehouse is so small that the fly gallery at the left and the paint bridge at the back are a constant embarrassment. The stage would have been more workable if these devices had not been employed.

These errors of construction, after all, indicate but one thing—that the stage has been regarded as a characteristic type of structure, to be built according to established rules, rather than as a place designed to fulfill a peculiar function. A stage is a space on which a dramatic action is to be revealed before an audience. Whatever the space at the builder’s disposal—its size or shape—or whatever the building he must remodel, that is the only thing to be considered. A play is to be given. The players must be seen and heard. There must be means for them to enter the presence of the audience, and exit. The space on which they appear must be illuminated. Somehow the space set aside for the player shall be able to suggest, either by means of scenery as it is commonly understood, or by some conventional arrangement, permanent or variable, a world in which the character he portrays might move.

Beginning with this much specification and no more, I propose to work out with some definiteness the principles underlying the construction of an ideal stage and the relation of the auditorium to it, bearing in mind all the while the fact that many of the stages in the War Memorial Buildings and little theatres are to be small, that large sums cannot always be spent on them, and that they must in most cases serve a variety of purposes.

If we remember always the function our stage is to fulfill, we have two good sources from which to draw practical details for its construction, and a third source, debatable but interesting. First, there are the errors which I have referred to. Some of these I shall discuss in detail in the next chapter. Then, most valuable of all sources, are the conclusions to be drawn from the practice of the most skilled architects and artists of the theatre. And finally, to be considered briefly, there are speculations as to the demands which the drama of the future may make on the theatre,—demands that can be forecasted inaccurately at best, but deserving a glance, perhaps, if only to call attention to the certainty that such demands will be made.

CHAPTER I.

ARCHITECTURAL TRADITION IN THE THEATRE:
THE AUDITORIUM

There are, of course, other types of auditorium and platform than that of the theatre. Churches, lecture halls, and the chambers of legislative assemblies are planned with the same general end of making a person or persons at one part of the room audible and visible to many persons gathered in another part. The ready defense of much bad planning in school auditoriums is that they were not modelled after theatres but after one of these other forms. To-day this will not serve as a defense. Interest in the drama is too widespread, and recognition of the social potency of the theatre is too general. And whereas none of these other forms of audience chamber meets the needs of the theatre, a well-planned theatre can serve any use to which a gathered community may care to put it.

The rocks which threaten disaster to our intent to devise a room which may serve as theatre, assembly hall, chapel, or whatever, are, if we go to beginnings, the traditional form of the theatre and its traditional décor. In the latter, time has wrought many changes. It was once felt that a theatre was not a theatre if it was not adorned with a wealth of gilded cupids, masks, tambours, and daggers, surrounded by stucco wreaths and garlands in high relief, and interspaced with pictured panels of the muses, especially those most at home in a playhouse. And, indeed, about those old houses, their garishness now mellowed, there is a glamor peculiarly of the theatre, and a sweet mustiness in the air bespeaking audiences of perfumed ladies, long since dead, the grease-paint and pomade of a long line of players, old scenery, the fine fustian of the old plays. It is somewhat like the odor in a garret stored with the treasures of our grandparents, or the mustiness of an old book. But these are faded flowers that cannot be brought to life, and the theatre of to-day, its plays and its players, are moved by a different spirit. Whatever lure these tinselly old temples have is a reminiscent one. To-day, there may be found theatres with the simplicity and peace of a church, the unobtrusive luxury of the drawing-room, and even, by overshooting the mark of simplicity, the bareness of the lecture-room or the legislative chamber.

The greater sincerity that has come into the theatre, and that fear of romance that marks the first decade or more of the Twentieth Century, did much to overcome traditional over-elaboration. There has come, too, a marked freedom from tradition in the planning of the usual large show-houses. The more modern theatres are, for the most part, free from those glaring structural ineptitudes that several centuries of custom had imposed. In Germany especially (the traditional form of the theatre did not develop there), great progress has been made, and the theatres of such architects as Max Littmann and Oskar Kaufmann serve as models. Stage machinery in Germany has been brought to a point of perfection not yet reached in any other country. Lautenschlager, Brandt, and Fortuny (a Spaniard) have contributed inventions that have only occasionally been experimented with in this country, and then somewhat half-heartedly.

Tradition clings close to its native heath, nevertheless, and in England, to which America looks first, perhaps, and in the Latin countries, it has enough vitality still to be a source of danger. It may be worth while to scan the history of the tradition, especially from the “front of the house”, before we consider the stage itself. For it is from here that the gravest criticism against a stage can be made,—that it is not easily visible from all parts of the house.[1]

[1] I shall not consider it expedient, in any part of this discussion, to go into questions of engineering detail. It is assumed that the architect is equipped or will equip himself with such technical knowledge. Nor shall I refer to structural modifications brought about by the regulations of Boards of Fire Underwriters. These matters have been treated more or less efficiently in several other works, to which reference will be found in the Appendix.

The form of the stage and the manner in which it has been used have, throughout the history of the theatre, been the primary factors in determining the shape of the auditorium. The Greek theatre was devoted to a ceremonial drama in honor of Dionysus, acted about an altar erected to him. So the stage took the form of a circular space with an altar in the center. The seating was arranged in concentric tiers, with the altar as a center, and more than half surrounded the stage space or orchestra. Tangent to this circle, and perpendicular to a line drawn through the center of the seating space, was built the skene, or back scene. At first, this was merely a dressing tent; later it was a wall, of wood or stone, masking the dressing-rooms of the actors. It was pierced with doors, giving access to the stage before it, and served as the palace, temple, or city wall, in front of which the scene of the play was laid. There is no satisfactory evidence that it gave on to a raised space conforming to the later stage platform. Chorus and actors were on the ground level of the orchestra. All the seats being raised, the spectator looked down upon the action of the play, and all the seats were set on radial lines drawn from the altar or center of the orchestra.

Stage of the Teatro Farnese at Parma, Italy. An
example of the picture-frame stage set into the
plastic stage of an antique theatre. See page 18.
(From Hammitzsch’s Der Moderne Theaterbau.)

Contemporary sketch of an Elizabethan Theatre.
(From Caffin’s Appreciation of the Drama.)

In the Roman theatre, a number of radical changes are to be noted. The large orchestra is no longer needed for a chorus, and the space is cut to a semicircle, in which are placed the chairs of the Senators. Since spectators are now on the ground level, the actors must be raised, and the stage becomes a long, shallow platform, beginning at the diameter of the circle. Raised tiers of seats, as in the Greek theatre, surround the semicircular ground space. At the back of the stage is a wall, or scæna, which also closes in each side of the stage, meeting the seats at the diameter ends. It is built to the height of the uppermost tier of seats. Since the stage extended almost the whole width of the seating, and was raised above the ground, sight lines were ideal.

Between the fall of the Roman Empire and the revival of classic learning in Italy, the theatre had no settled home. The drama went through various vicissitudes, took on new functions, expressed itself in new forms. The mediæval theatre of mysteries and miracles, after it had become secularized, went forth from the chancel of the church, and became a vagrant and an opportunist. It set up its paraphernalia in the public square, in the inn-yard, in the guild hall. For the most part, it was a daylight, outdoor recreation, with no fixed home, and no such special ceremonial functions as in the Greek and Roman state. It was proletarian, distinctly. With the Renaissance, in addition to the popular itinerant theatre of the people, there were two new manifestations. The humanists, in their academies, revived the Roman comedies of Plautus and Terence; the courts of the ruling families of the free cities became the scenes of magnificent productions of masques, pageants, “triumphs” and fêtes. These were usually allegories based on classic mythology or on ancient history, but presented largely in the form and manner of the popular drama of the time. To the presentation of the court fêtes, the greatest artists,—Bramante, Leonardo da Vinci, Giulio Romano, etc.,—brought their talents. They were given in the gardens of the palaces at night, illuminated by flares and fireworks. The “pageant” or wheeled stage of the mediæval popular drama, was used for the display of some large piece of decoration or machinery. As early as 1491, however, at Perugia, the first indoor performances were given. The stage went through various modifications, still keeping its resemblance to the stage of the mediæval drama, until one invention enforced the most radical development that had yet taken place,—perspective scenery. Hammitzsch[2] traces the invention of scenery in painted perspective to Bramante’s decoration of the sacristy of the Church of San Satiro in Milan. The wall painting represents in perspective an extended vista of the sacristy, in an attempt to make it appear larger. The modern counterpart is the mirrored restaurant. It is certain, at all events, that Peruzzi employed such scenery in dramatic representations in Rome before 1510. With these painted prospects came a variety of changes in the arrangements of the rooms in which the masques were given; the stage became more a place apart; it was set at the end of the room rather than along the sides, that the effect of distance produced by the painted prospects might be enhanced, and the proscenium frame enclosed it. However, when the theatre as a building designed specifically for the presentation of plays came into being, the form of auditorium was not so thoughtfully adapted to this new type of stage as had been the case with the ancient theatres. For it was to them that architects turned for models for the auditorium, though the stage was no longer the stage that went with the amphitheatre form of seating.

[2] Hammitzsch, Der Moderne Theaterbau, I. Teil, p. 11.

The theatre of the Academy of Olympians at Vicenza, begun in 1580 by the architect Palladio and completed in 1584 by his son Scillo (Fig. 1), is practically a Roman theatre roofed over, and equipped with a stage that compromises with the stage then in mode. It has a sloping floor (to increase the effect of the perspective) and alleys of scenery giving off each entranceway in the stage wall.

The Teatro Farnese in Parma, completed in 1619 by Aleotti, is the first modern theatre. In it appear theatre features that have come down to our own day,—the elongation of the amphitheatre auditorium into the horseshoe form, and a stage completely separated from the auditorium and equipped not only to handle the new scenery but to manipulate it quickly, so that changes of scene might be effected in the presence of the audience. In this theatre, Aleotti not only broke away from the classic stage but also from the multiple setting of the mediæval stage and definitely introduced the modern form of picture stage. Less completely did he break away from the classic seating, but he modified it somewhat to meet new conditions.

Figure 1—Plan of the Teatro Olympico, Vicenza.

With Aleotti passed the period of primitive experiment with a new instrument. From his day until very recent years, there was to be no marked change, except the introduction of balconies, a feature already anticipated in the theatres of other countries and soon employed in Italy, and the further accentuation of the horseshoe form. The old circle plan became an ellipse, and still later, as the side balconies were brought in closer to the stage, an oval.

In England, very much the same history was enacted. The old English miracle and mystery gave the theatre its platform stage, but the imitations of Latin comedy first gave it a permanent home.

Public performances of university-made imitations of Roman comedy were common during the reign of Edward the Sixth, and during the reign of Elizabeth (1558-1603) seventeen professional theatres were licensed for the exhibition of contemporary plays. In something like sixty years, the English drama and the English theatre had grown from crude beginnings to the highest point they have yet reached. And it was by professional companies of actors presenting dramas and not by the court or academic presentations, that the theatre was first given form. These companies, like the craftsmen bands of miracle and mystery players, acted wherever they could find a place or wherever they were bidden,—at court, in great halls, in the provinces, in the church or the moot hall or the inn, and in London, in the inn-yard or bear pit. It was the inn-yard that was most used and had the greatest influence on the form of the playhouse.

Figure 2—Plans of the theatre just completed in Berlin for the Berliner Volksbühne. The form of the auditorium is typical of the latest practice in continental and American theatre design (see page 27). The large amount of stage space, in proportion to the auditorium, however, is unfortunately not typical of American theatres. The second-floor plan is included to illustrate the general arrangement rather than to show the balcony form, which is neither typical nor particularly good.

The inns were usually built in the form of a hollow square. A small passage gave access to the inner court, which was surrounded by galleries. The stage would be erected at the end of the court opposite the entrance, and spectators stood on the level ground of the yard or found seats in the galleries. The bear pits or bull rings were usually circular buildings with several galleries similar to those of the inn-yards.

The earliest theatres, built about 1576, were round in shape, with these characteristic galleries. They seem to have been used interchangeably for theatrical performances and for bear-baiting. The centers were open to the sky, like the inn-yards, and only the galleries and part of the stage were roofed. The stages projected into the center, and could be viewed, both by spectators on the ground and by those in the galleries, from three sides. The only contemporary drawing of the Elizabethan stage is that of Johannes De Witt of the University of Utrecht, who visited London in 1596. His drawing of the Swan Theatre differs in many details from the specifications of the contract, but it gives a general idea of the form of auditorium and stage. With the building of these theatres,—The Theatre, The Curtain, The Hope, The Globe, Blackfriar’s, The Swan,—the use of the inn-yards did not cease, and the Queen’s men performed regularly at The Boar’s Head in Eastcheap as late as 1603.[3]

[3] Ashley H. Thorndike, Shakespeare’s Theatre, p. 42.

Contemporaneously, there were in England, as abroad, spectacular performances at court, richly costumed and decorated. They were performed in spacious palace halls, being acted on pageant wagons or on the main floor, and were viewed from benches and balconies around the sides. Eventually the pageant gave way to a stage temporarily erected at one end of the room, the dancers descending to the main floor for large ensembles and ballets. As early as 1607, scenery, curtains, and a proscenium arch had been used. The picture stage, with its scenery in painted perspective, was an importation from Italy, following a visit there of Inigo Jones, and under his hand reached a high degree of development during the third decade of the Seventeenth Century.

Figure 3—Above is the section of the Little Theatre, New York, showing clearly the relationship of the stage, auditorium and other portions of the building. The dressing-rooms are above the auditorium and are reached by both stairs and elevator. On the opposite page is the first-floor plan of the building. It is a notable example of the best contemporary American practice in auditorium arrangement. These drawings illustrate the building as originally constructed, without the recently added balcony and other changes. Harry Creighton Ingalls and F. B. Hoffman Jr., Associate Architects.

With the reopening of the theatres after the Restoration, the practice of the Italian theatre and opera house superseded the old-English tradition practically altogether, the only noteworthy remnant being the social distinction that made the ground level or “pit” the place of the proletariat in the theatre. The visits of the aristocracy to the theatre during the Elizabethan period, even when theatres were under court patronage, were something in the nature of an escapade. The sheltered galleries were reserved for the gentry, and the unroofed ground space or pit was open to the crowd. From the galleries, moreover, a better view of the protruding three-sided stage was to be had. In the later, wholly-roofed theatres, the stage still protruded somewhat. A great curved “apron” projected beyond the proscenium. Nor was the proscenium the mere picture-frame of to-day, but a deep portal. The balconies extended over the stage to the curtain, so that spectators at the forward ends of the balconies were directly above the stage. The balconies were given swelling curves, bringing them further toward the center of the stage, so that those who occupied these forward seats could not only see but could be seen. The stage boxes of to-day are a relic of this type of apron-stage theatre, and to-day, with the picture frame stage, serve no purpose but the stupid social one of self-display.

The apron stage preserved one great advantage of the platform stage: that of keeping the stage grouping, for at least a part of the audience, plastic. And the dimness of candle or oil footlights compelled the actors to keep to the front of the stage as much as possible. The disappearance of the apron has been due wholly to the improved lighting of the modern theatre. With its disappearance should go the auditorium features that belonged with it. And even though there have been occasional reversions to the platform stage and apron in the productions of Granville Barker or Jacques Copeau, there is no occasion for the revival of the horseshoe balcony or the stage box. In later pages of this paper, where I deal specifically with the stage, I shall recommend provision being made for an apron, either permanent or movable; but the auditorium should not revert.

Auditorium of the Little Theatre, New York. This building, constructed for Winthrop Ames in 1912, still stands as probably the best-designed small theatre in America. This photograph shows the absence of boxes, the carefully adjusted floor slope, and the harmony of all the decorative elements, although it hardly does justice to the intimate “feel” of the room. Recently large changes have been made in the building, a balcony having been added and a new decorative scheme carried out. Harry Creighton Ingalls and F. B. Hoffman Jr., Associate Architects.

Exterior of the Little Theatre, New York. Harry Creighton Ingalls and F. B. Hoffman Jr., Architects. (From The New Movement in the Theatre, by courtesy of Mitchell Kennerley.)

With modern resources in lighting and construction engineering, most of the “practical” considerations that determined the form of the old houses do not apply, and the social considerations that called for the display of certain parts of the audience are not even tacitly acknowledged in the more democratic theatre of to-day, except at the opera. Accordingly, the procedure of the architect should be governed wholly by considerations of utility.

The first consideration is that of visibility. A sight line drawn from any seat in the auditorium should give a clear view of the entire stage. As a general rule, therefore, the seating space should be very little wider than the stage opening. A sight line drawn from a seat to the right or the left of the proscenium arch past the corresponding side of the arch will cut off that corner of the stage. The closer the seat is to the stage the greater is the part of the stage concealed. (See Fig. 4.) Accordingly, it is the custom in most modern theatres to narrow the auditorium as it approaches the stage, so that the front of the seating is no greater in width than the width of the proscenium. The rear of the auditorium is slightly wider. (See Figs. 2 and 3.)

As a concession to this plan, the back of a stage setting is often narrower than the front. That is, in the case of an interior setting, the side walls of the room represented, instead of being set at right angles to the back wall, as is the case in most rooms, are set at an angle corresponding to the sight lines drawn from the extreme right and left ends of the last row of seats. This is purely a convention, required by the shape of the playhouse, and pardonable on the ground that it is less irritating to look at a distorted room than to be unable to see its corners.

At all events, this form of auditorium affords a higher visibility than did the old horseshoe shape. The most noteworthy move toward the adoption of this type of seating was made by Richard Wagner in the construction of the Opera House at Bayreuth. Here the auditorium is in the shape of a fan or blunt-nosed wedge, with the stage at the narrow end. The most approved type of modern auditorium follows this form to some extent. In such theatres as the Künstler Theater in Munich (Littmann), or his Prinz-Regenten Opera House, this plan is developed. (See Fig. 5.)

The general plan of the best modern American theatres is rectangular with the side walls converging toward the stage, beginning at a point about two-thirds of the way from the back. The seats are in concentric rows following a curve drawn from a center approximately at the middle of the back wall of the stage. The back wall of the auditorium follows the curve of the seats. The Little Theatre in New York is built on this plan. Where balconies are included, they have only a slight curve, approximately the same as that of the orchestra seats.

Figure 4—Plan of the theatre at the Carnegie Institute of Technology, Pittsburgh. The sight-lines from the sides of the auditorium are badly distorted, evidently to preserve the novel architectural effect of an elliptical room. By drawing lines from the outmost seats in the first five rows, it can be seen that spectators there will be shut off from any view of more than half the stage space. The one outstanding feature here is the large amount of space given to scenery storage-room and green-room.

It is a common fault of school auditoriums that the seating is extended to the right and the left of the stage, so that a considerable number of seats are valueless for seeing. They preserve, also, for no known reason, other than that it has been the theatre practice, the apron, projecting far beyond the line of the proscenium arch.

A second requirement for assuring direct sight lines from every seat to the stage is an inclined floor. In many cases, this appears an insuperable difficulty. Auditoriums which must be used as gymnasiums or dance halls require level floors. Often, then, the stage is elevated at a greater height from the floor than usual, in the belief that this device will overcome the lack of an inclined floor. On the contrary, it merely makes the spectator tilt his head at an uncomfortable angle, makes the players appear preternaturally tall, and, as they move toward the back of the stage, conceals the lower part of their bodies. The best height for a stage, whether with inclined or flat auditorium, is three feet, nine inches.

A number of means may be used to provide an inclined floor when performances are to be given in a hall which must be used for many purposes. In Copley Hall, Boston, movable risers were installed, each row of seats being lifted about six inches above the row in front. This scheme has the advantage of being the least costly at the beginning, but this consideration is outweighed by a host of disadvantages. The trestles and platforms occupy a large storage space when not in use, they are not a hundred percent safe, and they emit a squeak with every footstep. Moreover, they increase, to some degree, the fire hazard.

Far more ingenious and needing no storage space is the device employed by Laurence Ewald in building the Little Theatre of the Artists’ Guild, St. Louis. The theatre occupies a wing of the building used ordinarily as an art gallery, and has a level floor. When performances are to be given, the theatre seats are bolted to the floor, and the back half of the floor, which is built in one piece, hinged at the middle of the auditorium, is lifted at the rear by a four-ton hydraulic jack until a pitch of about one inch per foot is obtained.

Mr. Ewald has provided me with the following account of the construction of the floor:

“The movable part of the floor consists of a floor-bearing structure of steel which extends from a hinge half-way between the back of the house and the stage, and parallel with the front of the stage, to the back of the house.

“This structure is made up of four I-beams at right angles to the front of the stage, and another I-beam attached to them at right angles at the back end of the house. In the cellar, immediately beneath this cross beam, is placed an ordinary four-ton hydraulic jack, which, when operated, revolves the back floor structure on the hinges at the middle of the house. When the floor has been raised thirty inches, four legs suspended from the four I-beams drop of their own weight into position and support the load, and the jack is removed.”

Had it not been for the structure of the room under the auditorium, Mr. Ewald would have constructed the entire floor on a steel frame, as described above, and balanced it on an axle at the center, where the hinges now are. With suitable space under the front half of the floor, it could have been tipped on its axle, depressing the front and elevating the back, giving an incline to the entire auditorium. Built thus, the floor would require no jack and would be amply supported at three points; or, with the understructure built in the form of a truss, the floor could be made to rock on the apex of the truss. With this arrangement, the front half of the floor would have support along its entire length.

Figure 5—First-floor plan of the Munich Art Theatre. Note that the seats shown here form only a part of the main floor section, as indicated in the plans on the page opposite. Max Littmann, Architect.

Figure 6—Above is a section showing the arrangement and structural features of the Munich Art Theatre. Below is the second-floor plan. It should be noted that the seats here are not a balcony but a continuation, on the same floor slope, of the seats shown in the plan on the page opposite.

Another device, proposed for a great municipal auditorium in a western city, will not so readily commend itself for general use, because of the great initial cost and because of the depth of cellarage required under the auditorium. Here the entire floor was to make a semi-revolution. On one side of the revolving plane was a smooth flooring; on the other, seats were bolted. When the building was to be used as a theatre, the side with the seats was turned uppermost and held at the proper pitch. When the hall was used for a ball or for a dog show, or any function needing a level floor, the smooth side was turned up and secured at a horizontal position.

When the floor can be built with a permanent slope, either a simple incline or an incline in the form of a parabolic curve is used. The latter form is preferable.

In many places the fire laws limit the pitch of the floor to one inch per foot. With rows of seats spaced at the legal minimum of thirty-two inches this does not give enough clearance for the people in each row to see over the heads of those in the row in front. For a decent degree of comfort, a little seating capacity should be sacrificed, and the rows spaced thirty-six inches apart.

If possible, there should be a gradient of two inches to the foot, giving a difference of elevation between rows of six inches. If the law prevents the two-inch grade, the same effect can be produced by “staggering” the seats. That is, the seats of alternate rows are set in direct alignment, while the intermediate rows are set half a seat-width to the right or left. Thus spectators will look between the shoulders of those immediately in front of them, and will be able to see over the heads of those in the second row in front, who, by such an arrangement, will be sitting in a direct line with them. There will thus be a six-inch difference between each two rows of seats.

Beyond all these considerations of adequate sight lines, however, there is another requirement far more important, far less well understood, even in the light of any guiding or misguiding tradition, by the average architect. That is the requirement of good acoustics. Until quite recently, this was left wholly to accident. Buildings were erected, and the acoustic properties were tested afterwards. If they chanced to be good, the owners were to be congratulated. If they were bad, great sums were spent stringing piano wires, or nets of raw silk, or padding the walls. And then, quite as often as not, the acoustics remained bad.

The late Wallace Sabine, however, demonstrated that it was possible to predict the acoustic properties of a proposed structure with scientific accuracy, and to forestall defects by structural modification. In The American Architect, Dec. 31, 1913, Professor Sabine described the experiments by which the causes of the acoustic difficulties in the New Theatre (now the Century) in New York were discovered and overcome, and the methods which he employed in helping plan a number of the theatres designed by C. H. Blackhall, perhaps the most experienced theatre architect in the United States. This paper and others by Professor Sabine should be read by any architect who contemplates building an auditorium of any sort. The matter is too vital to be left to a hit-or-miss chance of success.

With an auditorium from every part of which the stage can be seen, from every seat of which all the words of the actors can be heard, there will be little fault to be found. Its comfort, its ventilation, its isolation from street noises, its protection against fire—these are matters which need not be treated here, and which have been written of elsewhere more adequately than I could write of them. As for its decoration, there are no rules to govern that. If the designer has bad taste, there is no help for it, except to avoid him. If he is an artist, let him exercise his art on the interior of the auditorium and forget the sort of thing that has traditionally adorned theatres and wedding cakes.

But, most of all, let him talk with the artist, if there should luckily be one, who is going to work in the particular theatre, and learn from him the sorts of play that are to be done, and the æsthetic of the group that is to present them, if it has one, and so find some clue to the atmosphere the auditorium should evoke. From then on, his task is one of high creation.

CHAPTER II.

THE STAGE PLAN

We are accustomed to regard as the stage of a theatre that part on which the actors appear, immediately behind the footlights, bounded, right and left, by the proscenium arch. As a matter of fact, this is a very small part of the stage. From the construction of many school stages and many of the stages of the little and experimental theatres, I am convinced that this misconception really exists. It is true that many little theatre groups have been obliged to choose between a cramped stage and no stage at all. On the whole, the work they have done, in the light of their limited equipment, is nothing short of amazing.

One well-known little theatre director has declared to me that he values these inadequacies because of the ingenuity required to overcome them. And I imagine that very frequently admiration for this sort of ingenuity passes current for the evaluation on its own merits of work done in these theatres.

No director could be hindered, however, by having excellent facilities at his command. His imagination, instead of visioning means of overcoming too low a roof to his stage or the lack of off-stage space, would be free to interpret the matter of the play itself. It would be a great pity to lose the work of many earnest groups who have been presenting plays in remodelled dwellings, saloons, or stables, with what appear to be hopelessly inadequate stages. But if a building is to be erected for the purpose of housing a theatre, it will mean greater freedom for the artists (in fact or intent) who are to occupy it, if they are given every facility that foresight can provide.

The stage, properly speaking, is about five times as large as the part of it that is visible to the audience when the curtain is raised. The spaces to right and left of the proscenium arch should equal the center space within the proscenium. Then there is the space above the stage, the space under the stage and the space required adjacent to the stage for dressing rooms, shops, etc.

Dimensions for practically all of these spaces can best be derived from the dimensions of the proscenium arch. The width of the opening generally is equal to half the width of the auditorium at its widest part. It may be somewhat less or somewhat greater, but it is well to establish a minimum of twenty-four feet for the width of the opening. Less than this will not give adequate space without serious crowding for the presentation of scenes with more than a very few people.

Figure 7—Plan of the Thirty-Ninth Street Theatre, New York. An example of good planning for sight-lines, illustrating an auditorium with center aisle.

In height the proscenium should be fittingly proportioned to the width, with a minimum of about twelve feet in mind. A stage too low and too narrow will throw the human figure out of proportion to his surroundings on the stage. Let us assume that we have a stage with a proscenium opening twenty-four feet wide and not less than twelve feet high. The aggregate off-stage space right and left should then equal about twenty-four feet, making the total width of the stage-house forty-eight feet. The depth of the stage should be not less than twenty-four feet. The height of the stage, from floor to “rigging loft” should be not less than thirty-six feet. The cellar under the stage should be not less than ten or twelve feet deep. This is merely a rough guide, using the measurements of the proscenium as index.

Claude B. Hagen, construction engineer for the Century Theatre in New York, suggests a “rule of seven” for the derivation of these dimensions, making all of them multiples of seven. The following table gives his measurements for stages of various sizes:

Proscenium width | 28 ft. | 35 ft. | 42 ft. |
Proscenium height | Seven feet less than width | | |
Height of loft | 56 ft. | 63 ft. | 70 ft. to 84 ft. |
Height of fly-gallery floor | 28 ft. | 35 ft. (7 ft. back of proscenium) | |
Width of stage | 42 ft. | 56 ft. | 70 ft. |
Depth of stage | 21 ft. | 28 ft. | 35 ft. to 42 ft. |
Cellar | 14 ft. | 21 ft. | |
Distance between border lights | Seven feet from center to center | | |

These measurements, while customary, are hardly ideal, and are generalizations from the more or less arbitrary dimensions imposed by high land values. It goes without saying that however small a theatre is, its stage should be as large as the plot on which the building stands will allow.

The off-stage space at the sides is particularly important. Without it, entrances to the scene are cramped, there is no place to pack furniture and scenery for other acts than the one in progress on the stage, and there is no place for the actors to await their entrances. Such space is needed, often, for the suggestion of other rooms than the one before the audience, and an important part of the lighting of the scene is done from the sides.

Next in importance is the space above the stage, the “flies,” in the technical vocabulary of the theatre. In this space, above the line of vision of the spectator, much scenery is hung until needed, lighting units are suspended, and with good overhead space, effects of height can be produced and ampler places revealed than that in which the audience sits.

The cellar under the stage is of especial importance where the off-stage spaces at the sides are cramped. It is used for the storage of scenery and furniture, for stage machinery and for entrances from a lower floor (with the aid of traps), and it often provides passage from one side of the stage to the other during the progress of a scene that occupies the entire depth of the stage. In some theatres, a part of the stage floor may be lowered by an elevator, and properties or furniture disposed of during the changes of scene, thus preventing crowding of the stage-house itself.

Figure 8—Plan of the Beechwood Theatre and Scarborough School. The entire space under the stage is given up to a workshop, and over the vestibule and lobby is a library. Additional dressing-rooms and a property-room are over the stage-level dressing-rooms shown here. The building is practically a complete theatre with two school-room wings. Welles Bosworth, Architect.

Hardwood should never be used for the stage floor. The architect of the excellent Arts and Crafts Theatre in Detroit, in his desire to use only the best of building materials, specified a stage floor of maple. As a consequence, it is almost impossible to support scenery by the use of stage braces, screwed to the floor with a stage screw or “peg.” Soft wood into which the pegs bite easily, is the only sort to use.

It is particularly important in small theatres that the stage walls be as unbroken by entrances as possible. At least two there must be: a large high door, opening to an alley or street, by which scenery may be brought in and taken out, and a small one, a stage entrance for the people of the theatre. It is well so to contrive the building that this one door gives access to the stage from the dressing-room corridors, shops, cellar, stairs, street and front of the house. With many doors opening on the stage, it is difficult to find space for the stacking of scenery without blocking them. It is often desirable to have one dressing room very near the stage or opening immediately upon it, not for the use of the star, but for the player who may happen to have the quickest change of costume.

Stages intended for the housing of large productions and traveling companies should include also a fly gallery, built out from one of the side walls of the stage at a height of not less than twenty feet from the floor. The ropes by which drop curtains, ceilings, and “frame-pieces” of scenery are raised and lowered are operated from this floor and are tied off to pins fastened in the gallery railing, technically known as the pin-rail. In smaller stages, of no great height, it will save space, construction costs and operating expense to have the pin-rail at the floor level.

Before discussing the equipment of the stage in detail, I wish to digress for a moment and consider the provisions to be made for the work that is done out of sight of the audience,—by the carpenters and property men, the seamstresses, the electricians, and the actors before they are ready to appear before the footlights.

Auditorium of the Munich Art Theatre. The plates on this and the following three pages, and the plans on pages 30 and 31 illustrate the interior and exterior appearance, as well as the structural features, of a modern European theatre which comes close to being a model for architects everywhere. Above is a view of the auditorium as seen from a point near the boxes at the back. The decoration in paneled wood (for acoustic reasons), the absence of proscenium boxes, the uniform slope of the auditorium, and the simple decorative curtain, are characteristic of the best contemporary European practice. (The photographs are reproduced by courtesy of the architect, Prof. Max Littmann.)

Exterior of the Munich Art Theatre.

A cross-section model of the Munich Art Theatre, showing clearly the arrangement of boxes, auditorium, exits, stage, hidden orchestra pit, double proscenium, etc.

A part of the auditorium of the Munich Art Theatre as seen from the stage. This is interesting chiefly as illustrating the arrangement of the boxes at the back, and the unbroken tiers of seats with side exits.

CHAPTER III.

PROVISION FOR BACK-STAGE WORKERS

I have noted in an earlier chapter that the architecture of the theatre is always governed by the function of the drama performed in it. The use to which the stage is put determines always the shape and style of the auditorium. There is no doubt that some great change is soon to overtake the theatre; the drama will assume a new form, demanding a new mode of presentation, and so a new theatre. Presently I shall discuss what forms this new theatre may assume, but for the moment it is enough to observe that it will be marked by a closer bond, one way or another, between the audience and the players, between the audience and the play.

For a long while, the theatre has shrouded itself in a sort of pseudo-mystery. “Back-stage” has had the lure for the layman of a hat from which rabbits are drawn by a conjurer. Of course, under inspection, such a hat is found to be as empty as any other, bearing even, in most cases, the mark of a respectable maker. And the inspection deepens the mystery. The stage has shunned this sort of scrutiny, because our drama of to-day and our theatre live mostly by “effects”. And if the effect is stripped of wonder, the theatre is almost as good as dead. What a sign of weakness this is! If the snowstorm is seen to be bits of paper shaken out of a bag, and if it is found that the imitation wind is produced by the scraping of paddles on canvas, the public will lose interest in the theatre.

And the people of the stage! How hungrily necks are craned for a glimpse of the popular actor or of the beautiful actress, should one pass in a hotel or on the street. They inhabit that mysterious, unexplored back-stage. And a clever manager will encourage this sort of curiosity by advising his people not to show themselves in the street, except unavoidably. The matter of seeing the actors close may be dismissed with a quip,—they might be found respectable upon acquaintance, or, more likely, dull. But the truth about the back of the theatre is the truth about the conjurer’s hat,—there’s nothing there to see, except the pitiful little bag of tricks, the snowstorm and the wind. There is not even the maker’s label. But this emptiness is not all, for as with the hat, it’s quite engrossing while the rabbits are there. The worst of it is that it is so poor, so mean often, so dirty, so cramped and littered, to the last, dark cranny, that we wonder how the actor-rabbits endure it all and keep their fur so white.

A rudimentary shame on the part of the managers, and a very human pride on the part of the actors, have helped to keep these matters from the theatregoer. Out front, there is warmth, light, comfort, elegance. The spectator is lulled into forgetfulness of work, and the play casts its spell over him. But a glimpse of the wretched barrenness of the dressing-room or shop would make short work of his peace of mind, just as a knowledge of the tricks sheers them of illusion.

These things are becoming known, because the bond between the spectator and the theatre-worker is already being formed. When it is full grown, such facts will not be discovered; they will no longer exist. For two movements that are bound to affect the theatre of the future are bringing the lay public clambering over the footlights and crowding in at the stage door. One, the Little Theatre Movement, is almost altogether a lay insurgency. In scores of communities, it has made its way; tradesmen, students, clerks, mechanics, people of leisure and working people with a little leisure, have come together and in a short time have plumbed the silly little mysteries of back-stage, and have brought into their theatres a little bit of the real Mystery of life and art that belongs there. And the more extensive, democratic Community Drama movement is making play-actors and theatre-workers of thousands who have heretofore been auditors. There will always be a professional group of artists of the theatre, but in their theatres there will be a close understanding and perhaps a physical connection between the audience and the stage; in the great, popular theatre it is conceivable that there will be very little distinction between the auditorium and the stage. It may be that they will be interchangeable or be one and the same. Then, it is certain that the conditions of comfort and convenience that apply to the one shall apply fully to the other, that the actor shall be as well cared for in the theatre as the public.

Let those who are building to-day look to this: Visit the dressing-rooms, see the workplaces of the other workers of the theatre,—the carpenter, electrician, property-man, and wardrobe workers. Consider these workplaces, not only in comparison with the front of the house, but as fit places for human beings to spend as much as an hour a day. Consider them as places where work that should have in it joy and beauty may develop.

The community theatres that are going to be built within the next few years are bound to be a blessing to those who have access to them. But, for the most part, their projectors and builders are laymen, knowing little of the vast work of preparation that must be done before a play is ready for an audience. Where the commercial theatre builder does not care how the actor and the theatre mechanic fare, the lay builder is a little likely to overlook their existence. I have seen dozens of clubs and schools, with fairly adequate stages and auditoriums, but with no more than two small dressing-rooms, one for men and one for women. I have seen several with no more than one, originally intended for a closet but set aside as a dressing-room when it was discovered that something of the sort is indispensable.

Aside from the fact that the players and the workmen are human beings, quite often of the same tastes and breeding as those who occupy the front of the theatre, they have a long and exacting work to perform, most of which can be done only in the theatre. And their domain is the part of the theatre behind the proscenium line. The actors must rehearse for several weeks before the play can be acted. They must be in the theatre some time before the curtain rises on the play and they leave it some time after the play has ended and the audience has gone home. For they must dress and “make-up”, and should be allowed a little while to shake off John Smith and enter into Hamlet. There is, moreover, scenery to be built and painted, furniture and properties to be made, lights to be arranged, effects to be devised, costumes to be cut, fitted and sewed.

How should these activities and these workers be taken care of?

First, the actors.

For their rehearsals, first of all, the stage should be used. If the stage is otherwise occupied, with scenery, or with the rehearsals of another production, as it often is in busy theatres, there should be another place in the same building where rehearsals can be held, a room with as large a floor as that of the stage proper. But, as often as possible, the stage should be used for rehearsals.

Then, for their preparation to appear in a performance, their dressing and make-up. Dressing-rooms must be provided, sufficient in number to accommodate the cast of the average play without crowding more than two people to a room. Under ideal conditions, each player will have a separate room, so that he can prepare for his performance, mentally as well as physically, without disturbance. The rooms should be not less than eight by ten feet, should each have a window, and should be heated in winter. Against one wall there should be a long shelf or table, about eighteen inches wide. Above it, should be a good mirror, with lights so placed that the face of an actor seated at the shelf and looking into the mirror will be well illuminated. Under the shelf, there should be a drawer in which make-up materials may be kept. Each dressing room should be provided with a washstand and with hot and cold water. There should be a high clothes-closet or wardrobe in which costumes may be hung. Where this is impractical, there should be sufficient hooks to accommodate a number of costumes, and means of covering them with a cloth to protect them from dust. Above the clothes hooks, or at the top of the closet, should be a shelf for hats, shoes, etc.

It is well to provide from eight to twelve dressing-rooms, each large enough to accommodate two persons. In addition, there should be two large rooms, each with space for about a dozen persons, these to be used for chorus, supernumeraries, or players of small parts.

On each dressing-room floor there should be proper toilet accommodations for each sex. Also, the ideally equipped building will have shower baths. In these days of Dunsany, Hindus and Arabs and Ethiopians may be met in many a town en route from the little theatre to their homes, there to wash themselves white.

It has been noted that, to preserve the unbroken wall space of the stage as far as possible, dressing-rooms should not open directly upon the stage floor. In many theatres, they are ranged off galleries above the stage. On the whole, this is inadvisable. A dressing-room door, inopportunely opened, will let a beam of light fall upon the stage, often spoiling the lighting of a scene. The slamming of doors, sound of voices, and other noises are almost unavoidable. And the argument usually advanced for so arranging dressing-rooms—that the actors can hear what is going on on the stage and thus be in time for their entrances, is fallacious. This very fact breeds in them a confidence that makes them careless, and they are more often late than if they were required to wait for their cues on the stage.

One more thing should be provided for the actor, not indispensable, but making for fellowship and comfort—the feature known in German theatres as the Konverzations-Zimmer and in older English and American theatres as the Green Room. This should be a comfortable lounge, furnished more as a room in a home or club, than in a theatre, and stocked with books and periodicals relating to the theatre.

With the actor carefully considered in the matter of cleanliness and cheerfulness backstage, a new pleasure will come into his work. Likewise, with the other workers of the theatre. Closest to the actor, perhaps, the wardrobe people. In the ideal theatre two rooms should be set aside for the wardrobe, one for the making of clothes and another for their storage. The sewing room, needless to say, should be well lighted, should have a space partitioned off as a fitting room, should be provided with proper closets in which to hang dresses in the process of making, and should be large enough to allow for a number of seamstresses and a large cutting table. There should be a built-in closet equipped with shelves and drawers in which to store cloths, trimmings, findings, etc., for the making of costumes. For the costume storage room, a loft space that might otherwise go to waste can often be utilized. This room should have long closets, fitted with bars on which dresses can be hung, and should have drawers in which other items of dress can be packed—hats, shoes, wigs, stockings, tights, etc. These drawers should be numerous enough to allow for the sorting out of costumes by colors or periods, and should be properly labelled.

Each of the mechanical departments should likewise have its two rooms, one a shop and the other for storage. The carpenter, if the scenery is built in the theatre, often can use the space under the stage for building. If he cannot build his scenery there, either another place should be set aside or the scenery should be built outside the building. He should not use the stage. It must be kept free for rehearsals. He should have, however, a room in which to keep his tools, draw his plans, and file his ground and framing plans, bills, time-sheets, etc.

The matter of storage space for scenery is to be determined wholly by the amount of space at the builder’s disposal and the use to which the theatre is to be put. If many productions are to be made, a space should be provided for a scene-dock, adjacent to the stage but separate from it, unless the building is small, in which case a storehouse elsewhere may be used. Scenery should not be allowed to accumulate on the stage. The theatre of the Carnegie Institute of Technology at Pittsburgh has an excellent dock, shown on the ground plan, Figure 4.

The property department needs a shop for the making of furniture, papier mâché work, etc., and a storage room in which furniture and other stage furnishings can be stored. Often one large room can be made to do for both.

The electrical department likewise must not be overlooked. There must be closets for the keeping of incandescent bulbs, lamp dyes, plugs, connectors, cable, wire, and other electrical hardware, gelatines, color frames, etc. There must be provision in the shop for the dyeing of lamps, testing, repairing, etc.

The property and electrical departments, like the carpenter’s, must also be fitted in a sense as offices, for the keeping of electric and property plots, full records relating to past and coming productions, bills, orders, receipts, time sheets, and like data.

It may be objected at this point that these various demands presuppose a large-sized plant with elaborate equipment. As a matter of fact, they apply quite as much to the tiniest of little theatres—even more so, for in such, proper ordering of space and isolation of separate activities is equivalent, in getting efficiency, to more ample space less carefully sub-divided. For, inevitably, these various kinds of work must be done in the theatre, and the people who do them must find space here or there for their work, and the things they make must be kept somewhere. Unless each job and each product is assigned its proper corner, the building is soon a clutter of stuff, accumulating dust, getting jostled about and broken. Then we are back at the old, dark, dirty theatre we are trying so hard to improve upon. The provisions discussed above, though they are not on the stage, are very much a part of it, and go far toward making it an instrument of precision.

In community buildings and schools, the various workshops, rehearsal room, etc., can often be combined with rooms serving other purposes. In any case some provision for them is quite as important as the open stage itself.

CHAPTER IV.

THE EQUIPMENT OF THE STAGE[4]

[4] Throughout this chapter I am at a disadvantage in that I do not thoroughly believe in the standards which I here set up. It is true that I am recommending higher standards than usually prevail in the sort of building which is here considered, or higher even than those that prevail in the well-equipped professional theatre. It is true, also, that these recommendations as viewed in the light of the known and tried methods of play production, are in the nature of reform and improvement. As such, I believe in them. As viewed in the light of the theatre of the future, I do not so thoroughly believe in them. But only a revolution in theatre methods can refresh our conceptions of what sort of place this theatre of the future is to be. This matter we shall leave for discussion in a final chapter. I should be ill-advised in advising ambitious groups interested in building adequate little playhouses to set aside finally the known and tried methods of play production and the stage they involve for methods adapted to a type of drama that may not yet exist, for methods that must be evolved only by sensitive and versed artists of the theatre. It is true that many signal new ideas come into any art through workers who do not know or trouble about tradition, young hands who blunder upon valuable methods through attacking their medium experimentally. For instance, Antoine, a gas-fitter by trade, who began his theatrical career as an amateur, by his daring innovations in the Théâtre Libre, renewed the life-force of the French theatre. But, in the main, I believe that the most important revolutionary changes in the stage are wrought by men who are thoroughly versed in the old practice, as was Gordon Craig. Hence, if the little theatres and community playhouses continue for the coming generation with a theatre modelled after the best practice of this our day, they may in good season contribute mightily to that theatre of the future to which I referred. Hence, for the present it is best that I continue in the rôle of reporter, rather than that of prophet.

The outstanding point about the stage, apart from the life the actors bring to it, is that it is a machine. It is a mechanical device used to aid in the setting forth of a play, much as a potter’s wheel aids the maker of vases, or a mortise and tenon machine helps the cabinet-maker. Perhaps the cabinet-maker is no less a hand-craftsman because he uses the mechanical device to shorten his labor, and it is probable that the vase has a truer form for being turned on a wheel. But cabinets have been made wholly by hand and vases turned without the potter’s wheel. There are people who treasure works made wholly by hand above the machine-aided work, however artistic. The theatre once did without the adventitious aids it now employs. Once it was merely a platform set in the sunlight, revealed to the sight of an assembled audience. Many believe that the theatre of the future will be something of that sort, welcoming, however, in addition to or instead of the sun, the more constantly available, controllable and subtly colorable electric light.

But the Greeks had their machines for the revelation of gods, and there is something about periaktoi, or revolving pieces of scenery. It is with the machines that the theatre has concerned itself most of all. Every developed stage has employed an amount of mechanism for the producing of those “effects” which I mentioned in the preceding chapter; and it may be that the theatre always will,—one wing of the theatre, the Right, doubtless.

Of late years, with the advent of the naturalistic or realistic type of drama, the stage has sought more and more illusion, not only in its imitations of the movements and acts of men and women but in its representation of their surroundings. It has tried to become a more perfect machine,—more nearly an instrument of precision. It may be significant to observe that, although masterpieces of drama gave impetus to the development of the illusion stage,—outstandingly the plays of Ibsen,—the illusion stage has brought forth no masterpieces. In this country, it may be held responsible for the buzz-saw, train-wreck, or horse-race type of melodrama, a type now happily removed from the theatre by the moving picture with its still higher degree of visual veracity. In Germany, the stage as machine has been developed to an extraordinary degree, and, for the most part, never debauched by exhibitions of effects for their own sake, as in our sensational melodrama of half a generation ago. I shall discuss a number of these German inventions in a later chapter, but for the present propose to consider the stage as a machine adapted to average demands.

There are two primary demands—that the machine shall be able to do the work demanded of it efficiently and with a minimum danger of breakdown, and that the machine be subject to control. The work of the stage-machine is, of course, the handling of scenery, the illusion-stuff of the present-day stage. This scenery is of two types: pieces that are suspended from ropes (hanging pieces), and pieces that stand on the floor (set pieces). For exterior scenes, the first type includes drops, “borders” representing foliage, leg-drops representing trees, pillars, arches, etc., or sections of wall, house-front, or other flat architectural units, large enough to warrant hanging overhead when out of use, so as to save floor space; and—for interior scenes—ceilings and back walls. The second type includes, for exterior scenes, any low-standing units, such as walls, hedges, fences, tree trunks, “wings” or set-houses; and for interior scenes, the side-walls of the room and very often part or the whole of the back wall.

For the manipulation of hanging scenery, the most important piece of stage machinery is the grid-iron. This is a slatted platform of steel or iron joists, built a few feet below the roof of the stage, just enough below to allow head-room for a man standing on it. Along the center of the grid-iron, on a line at a right angle to the foot-lights, is set a row of blocks and sheaves of a special type, manufactured for stage use. Equidistant right and left of this center row by half the width of the stage proper (the part of the stage within the proscenium) are other rows. Over these sheaves, ropes are passed. Thus, hanging over the stage parallel to the back wall, in sets of three, are lines to which scenery may be attached. The other ends of the lines in each set are brought together at one side or the other of the stage, so that the three ropes of each set may be operated as one. On the side to which the lines are led is located the pin-rail, either on a fly-gallery or at the floor level. Of each set of three, the line hanging nearest the side from which the lines are operated—the pin-rail side—is known as the short line, the line most remote from it is known as the long line, and the other as the center line. On very large stages, with an opening of forty feet or more, four lines to each set are advisable, not only to bear the greater weight of the larger pieces of scenery required, but also to secure a better trim, or level hang of the scenery.

These lines, needless to say, should be of the best hemp rope, of a weight adjusted to the size of the stage. Half-inch line is the lightest it is wise to use. This rope should be subjected to periodical inspection, to forestall breaking and the falling of scenery, with consequent damage to the scenery, the play, or the actors.

On some grid-irons, the blocks are screwed to the under side of the grid. This is unsafe, as they have been known to tear loose. They should ride the joists, the lines dropping between each two. At least twenty-five sets of lines should be provided.

When a set of lines is not weighted with scenery, sandbags are tied to the loose ends, so that they may be lowered to the floor when needed. Frequently a piece of scenery will be found too heavy for one or two men to raise from the floor. In such cases, counterweights in the form of large sand-bags are hung on the part of the lines between the grid-iron and the pin-rail.

The primary purpose of hanging scenery in this fashion is to be able to haul it out of sight in the upper part of the stage when it is not in use. Hence large overhead space is necessary. This system also makes possible the use of unstiffened scenic units, such as drop curtains and borders, which, literally, have no legs to stand on.

In large stages the lines are controlled from a pin-rail on a gallery, built out from one of the side walls of the stage. In smaller stages the pin-rail may be built against one of the side walls on the floor level. This has various advantages—ease of access the foremost, and the saving of a stage-hand, who would otherwise have to remain on the fly-gallery, besides. The advantages to be claimed for the fly-gallery are that its use leaves the stage floor clear of ropes, leaves the side wall clear for the stacking of scenery, and is a valuable vantage point from which to cast light upon the stage.

The stage of the Century Theatre is equipped with a counterweight system that practically eliminates hand-power in the raising and lowering of hanging scenery. To each set of lines is attached a metal case, or container, which rides up the stage wall between tracks. At the top of the stage, above each container, there is a magazine filled with buckshot. By an ingenious mechanism, when a piece of scenery hanging in the loft is to be lowered to the floor level, a quantity of the shot in the container is allowed to flow out, so that the scenery outweighs the counterweight and descends. Its descent can be stopped at any point by brakes on the lines. When it is to be raised, shot from the magazine above is allowed to flow into the container until the counterweight outweighs the scenery, and the scenery ascends. The shot that flows to the bottom of the chute is conveyed by an endless chain-and-bucket conveyer to the magazines at the top. Such a system is only warranted on stages of opera-house proportions. There are also systems for controlling the lines by motors; but on the stage of average size, man-power is the safest and most dependable.

Scenery that stands on the floor requires little by way of machinery. Some of it is self-supporting, as are the “wings,”—folding, screen-like pieces used to mask the sides of the stage. All set scenery is “framed,” so that it stands rigid enough when braced from the back. Part of the equipment of every stage is a supply of stage-braces for the support of such scenery. These are made of hardwood, can be extended to any desired length, have a prong at the top which hooks into a screw-eye fastened to the scenery, and a foot-iron at the bottom which can he fastened to the stage floor by means of a stage screw or “peg.” The use of these pegs demands a soft-wood stage floor into which they will bite easily. Good stage braces can be obtained from any reliable dealer in stage equipment.

The main curtain of the theatre, if it raises and lowers, is often operated from the fly-gallery. It is better, however, to have it operated from the stage level, on the same side of the stage as the fly-gallery or the pin-rail. The draw type of curtain is always handled from the stage floor. “Travelers” for these curtains can be more cheaply bought than made, and are kept in stock by any stage-rigging firm.

It is well to have the stage flooring built in lateral sections resting on joists that run the width of the stage. When traps are needed in the floor, they can then be cut without difficulty at any point.

The lighting equipment of the stage, by far the most important of its mechanical attributes, I shall describe later, but I shall treat here of one device, which is structural. It is one of the German inventions for the perfection of illusion to which I have referred, and the only one I recommend to little theatres, far and wide. I recommend it because of the added beauty it can bring into the playhouse, rather than because of its merit as a part of the perfect machine. This is the Kuppel-horizont, or sky-dome.

The sky-dome approximates in shape a quarter-sphere, much like the shells commonly placed behind out-door band stands. The base line begins far enough toward the front of the stage and behind the proscenium to be masked from the opposite side of the auditorium, and sweeps around the back of the stage. The back and sides of the dome rise vertically for some distance and then arch at the top toward the front of the stage. The higher the dome is, the less the canopy need overhang the front of the stage; and the less it overhangs, the more grid-iron space is available for hanging scenery. But it will be seen at once that the more dome there is to take the place of the usual hanging stuff, the fewer of the usual tawdry borders are needed.

The late Wallace Sabine, in a series of experiments conducted with a model built at Harvard University by Theodore C. Browne and the present writer, concluded that the quarter-sphere was disadvantageous to the acoustics of the stage and was not required in order to obtain the best results in lighting. He recommended a form flatter at the back and with a sharper curvature at the sides and top.

Three modifications of this device have been installed in little theatres in America—one at the Neighborhood Playhouse in New York, one at the Beechwood Theatre in Scarborough, and one at the Arts and Crafts Theatre in Detroit. The Neighborhood Playhouse “dome” is really little more than a cyclorama built in plaster. It has no canopy overhead, and the ends extend toward the front of the stage only a little distance. The one at the Beechwood Theatre is similarly simplified. But even this plaster cyclorama is a great improvement over the canvas cyclorama in its stability, freedom from wrinkles, and better diffusion of light.

At the Arts and Crafts Theatre, the ends of the dome do not curve toward the front of the stage at all, but the top arches, forming a canopy over the back part of the stage. The only true dome in this country was installed by Samuel J. Hume at the Madison Theatre in Detroit, now used as a moving-picture playhouse.

With such a dome, a great deal of the litter of painted scenery can be done away with. A background of light takes the place of the usual painted back-drop, and much of the scenery usually set at the sides or hung overhead, merely to keep the eye from penetrating to the back-regions of the stage, is no longer needed.

Added to the stage at the time of construction, the dome costs little more than the price of its materials. The initial cost will be saved many times over in the decreased cost of scenery. The very least that should be done, if the budget does not allow for the construction of an entire dome, is to plaster the back wall of the stage. This, more than counterweights, traps, revolving stages, and all the other paraphernalia of advanced construction, will extend the possibilities of the stage machine, not only for the uses of illusion but for the service of the imagination.

A familiar feature of most theatres in which productions are made is the paint-bridge and paint-frame at the back of the stage. Here the scenery to be painted, mounted on the frame, is raised and lowered before the bridge. To my mind, this is a waste of space and money. Primarily it is a waste of space at the back of the stage. If the dome is used it is quite out of the question. But, strongest argument of all, it is not needed. If the scenery must be painted in the theatre, it can be painted lying flat on the floor. The saving on this item may well be enough to cover the cost of the sky-dome.

Auditorium of the Arts and Crafts Theatre, Detroit. This theatre is of particular interest in connection with the movement to build community houses as war memorials. It shows how a playhouse may be fitted informally and beautifully into a building not designed primarily for dramatic purposes.

Auditorium of the theatre at the Carnegie Institute of Technology, Pittsburgh. This is an admirable example of dignified decoration, uniform floor slope, and generously spaced seats; but the auditorium is too wide to secure adequate sight-lines from all seats. See plan on page 28.

CHAPTER V.

STAGE LIGHTING

The most vital part of the stage machine is yet to be touched upon, the only part in which any mystery is involved. After all, most of our machinery of the theatre is of the simplest type,—ropes and pulleys and simple bracing. In a double sense, the electrical equipment is approached with more awe. While most people know a little about the simpler laws of mechanics, electricity, guarded by an element of danger, is a matter too recondite to be brought into the fold of everyday information out of mere curiosity, or to be reasoned out as the childish working of a pulley can be figured out by common sense; it has to be studied and learned. And besides being outside common matter-of-fact, light is mystery itself, unplumbed nature, a fraction of the inscrutable life of the world led by strings to the stage.

If the little playhouse is without any mechanical convenience, if its stage is cramped and mean, it can still achieve visual beauty through light. This force brings into the playhouse the most vibrant, subtle and affecting gift of the physical world, barring only the human presence.

Ultimately it will be seen that a forthright attempt to imitate nature on the stage can result only in failure; the painted or modeled semblances of rocks, trees, grass or distant prospects are in the long run seen to be what they are not what they pretend to be. Similarly, close as the light of the stage can be brought to resemble the light of the outer world, it will still be short of complete fidelity to its original. But it is, in itself, a force of beauty, an authentic transplanting of the revealer of nature’s divers beauties, so that, if it fails to achieve what the manipulator tries to make it do, it may achieve something possibly more beautiful.

More and more can this be true in the theatre, as the artist comes to regard light as a pure medium, as he learns more of its profound effect on human emotion, even on the working of the body’s organs, and as he becomes familiar with the thousand subtle ways in which the earth and its atmosphere modify the light sent by the sun, reflecting and refracting it, stealing certain colors from its whiteness and leaving others, resolving it prismatically by mists and clouds and the swirls of atmosphere. These are a few of the ways in which nature plays the artist with light. They point to unlimited lessons in technique that the theatre artist in light has yet to learn.

The little theatre, or any theatre for that matter, cannot go wrong by beginning at the beginning. Let it revalue the customary machinery for stage lighting, and the results achieved by its use. Later I shall describe this customary equipment, for it has its great uses, and much of the criticism that I shall apply to it applies perhaps with greater justice to the manner in which it is used. But, implicit in the system itself, is a criticism of its purpose to reproduce the effects of nature under conditions that in nowise resemble those of nature, or its laying over a convention (artistic at its best, futilely anachronistic at its worst) not another convention, but a lantern of Diogenes, showing up shams.

Go back to the beginning. One candle rightly used, as in Robert Edmond Jones’ lighting of the den scene in Redemption, is both drama and beauty. Imagine Wallace Stevens’ Carlos Among the Candles shown upon the stage by the candle light of the strange room-world which is the play’s universe. Here is a complete wedding of drama and the mobile beauty of light itself, a light we can readily achieve. From these candles to the sun of Shakespeare’s comedies, the storms of his Lear or the mists and fogs of The Tempest is a far cry. He begged the question, in extraordinary verse, and acted the words and emotions of his plays in the plain light of day, which is bound to be beautiful, even when it is not illusive of the moon.

Right here lies the crux of the problem of installing lights in the little theatre. A dual approach is required, as in any art: the creator’s vision of what he wishes to do, and the technician’s knowledge of how to go about it. The greater responsibility rests on the first function, for we must settle whether we are to try to reproduce nature or attain a correlative beauty. To me the beauty of a stage sunset has rarely been the beauty of a real sunset; it has been the beauty of rosy light. If anything, the unreality of the sunset has stood in the way of my appreciation of the reality of red. The beauty of red was accidental, and not the artist’s intention. It could not have been avoided, for it is germane to sunset, but the fact remains that the artist achieved something other than he set out to achieve. It would have been better to go in for red and attain it than to go in for sunset and attain red. If blue light intimates the moon, well and good. It is beautiful itself, and does not awaken marvel at the cleverness with which we have contrived an effect. Whereas a nicely operated moonrise, or a jiggling procession of stereoptican clouds leaves us gaping while the tragedy hobbles, unattended, to it close.

When the theatre forsook the sunlight, it faced the question of light solely as illumination. By various means,—torches and tapers, gas, “limes” and electricity,—it has made its art visible indoors and at night. The introduction of electric light into the theatre has made possible an illumination so dependable and controllable that of late years attention has been turned to other phases of the lighting problem. Thanks must be given for most of the advance thus far to the effort of the illusion-theatre to imitate the light of nature. My belief is that the greater advance lies ahead, in the study of light on the stage as an art medium per se.

Two important things the stage worker of the modern theatre contributed, through his rough approximations of realistic effect, two things that will serve, whatever our aim in lighting. He saw that the light at some seasons, in some weathers, and at some times of day, is less bright than at others, and that it fades at dusk. He devised means, therefore, of varying its intensity. Second, he perceived that at sunset light is one color, at noon another, and by full moon another. He gave us dyes and color screens, and with them and his dimmers brought to the stage the important element of control.

Other advances, through other agencies in the theatre, tend to subtilize the function of light, carrying it beyond primary illumination. Second, perhaps, comes the scene designer, who demands that the light, in addition to illuminating the players and stating the time of day or year, shall contribute values to his design as picture. It shall be made to cast shadows where dark masses are wanted in his composition. It shall highlight other features of the scene; it shall reinforce the painter’s work with color; it shall give plasticity to the builder’s work with its highlight and shadow.

Next, the dramatist and producer make their demands—the light shall reinforce the mood and meanings of the play. By its intensity or dimness, it gives “atmosphere”; by its color it has a direct psychological and physiological effect on the spectator, sensitizing him to values in the play he might not perceive were it enacted in light of another sort. Dramatist, director and designer, in the lighting of a play, if nowhere else, should be so much at one that it is easy to understand Gordon Craig’s wish that one man should combine the functions of all three.

Light, in the theatre, then: (1) illuminates the stage and actors; (2) states hour, season, and weather, through suggestion of the light effects in nature; (3) helps paint the scene (stage picture) by manipulation of masses of light and shadow and by heightening color values; (4) lends relief to the actors and to the plastic elements of the scene; and (5) helps act the play, by symbolizing its meanings and reinforcing its psychology.

To achieve these five functions of stage light, five different kinds or sources of light are not, of course, needed. One light may combine several, or all, of these functions. In Joseph Urban’s lighting and setting of the last act of Tristan and Isolde some years ago at the Boston Opera House, a beam of late afternoon sunlight struck across the stage to the figure of Tristan lying beneath a great oak tree. Slowly, as the day waned, the sun patch crept from the figure, until, at his death, it had left him in cool shadow. Thus, a light that illuminated, that told the time of day, that gave the figure of the singer and the bole of the great tree high relief by striking from only one side, also aided symbolically and psychologically in the interpretation of the drama. Thus to make light function in many ways is to use it with a sense of its ductility and subtlety as a medium of theatre art. In it we have the only single agency in the theatre that can work with all the other agencies, binding them together—that can reveal with the dramatist, paint with the designer, and act with the actors.

The machinery by which this medium is brought to the stage and through which its wonders are wrought commands a deep respect. Tradition has already laid its heavy hand here, and innovation in lighting equipment moves slowly. It is almost wholly within the last five years in the United States that lighting units of marked novelty have been introduced.

Of first importance is the machinery of control, the switchboard and dimmers. The customary place for the board in American theatres is at one side of the proscenium arch, either on the stage floor level, or on a perch raised some nine or ten feet above the stage floor. The manifest disadvantage of this location is that the operator cannot see the whole of the stage, and must depend for his cues upon a stage manager. It has, therefore, become the practice in many European theatres to place the operator in a pit directly in front of the stage, shielded from the auditorium and facing the actors. From here he can watch the action and see the effects of his lights constantly. Telephone connections with lamp operators at the back of the stage enable him to keep them under his control.

The construction of the board and mounting of the switches are strictly prescribed by boards of fire underwriters in various cities, and need not be detailed here. The important consideration at this point is that, so far as possible, each light unit on the stage shall be subject to central control from a vantage point from which the stage can be seen; that each unit shall be subject to separate control; that groups of like units, classed by location or color, shall be subject to group control, apart from other groups; and that the stage light, as a whole, shall be controllable apart from the house lights.

That is, assuming, for purposes of illustration, the arrangement of lights common to most theatres, the white lights of the first border shall be controlled by a switch apart from that controlling the white lights of the second border or the third or the fourth. So, likewise, for each color circuit of each border, separately. Then there should be a white border main switch, controlling the white lights of all the borders, and a blue border main, etc. Above these, there should be a border main switch controlling all the border lights simultaneously. And thus with each division of the stage lights. Over all, one stage main switch should control all the lights of the stage. The auditorium lights, with their own switches, should be controlled from the same board as the stage lights.

The outstanding item of expense in building a good switchboard is the cost of dimmers, the resistance devices by which the intensity of the light is controlled. They vary in capacity with their wattage and type. But the dimmers, more than any other part of the control system, contribute to the flexibility of the machine. In a modern theatre they are indispensable.

So far as possible, there should be a dimmer for each switch on the board, controlling each light unit separately. With “master” levers, related light units can be ganged and controlled simultaneously. When only a limited number of dimmers can be afforded, it is possible so to construct the switchboard that circuits to be dimmed can be “shunted” through the dimmers, while circuits that need not be dimmed remain on constant. A very ingenious board of this type was designed by Mr. Bassett Jones for the Artists’ Guild Theatre in St. Louis. This board has eight dimmers which can be used for any eight light units on the stage, giving it a far greater flexibility than it would have if only a particular eight could be dimmed. It is, however, rather complicated, with its dual system of constant and dimmer plugs and connectors, so that only great familiarity with it makes it quick in action.

In addition to the switchboard type of dimmer, there are also smaller dimmers made for use with nitrogen lamp spots and floods. Where these are used I believe they should be set by the main switchboard, rather than on the lamp itself. Attached to the lamp they require an additional operator and break up the centralization of control.

The actual stage lights fall into two classes—stationary and movable. The stationary or fixed equipment has remained, on the whole, highly conventional. It consists, primarily, of the footlights, a trough of lights set along the floor at the front edge of the stage, throwing light upward upon the actors and the scene, and the border lights, hanging troughs, adjustable in height, throwing their light downward. The first of these border lights, often known as the concert border, hangs immediately behind the curtain or proscenium drapery, and the others are hung at intervals of seven feet from center to center. The footlights and borders are usually wired in three circuits, each circuit being filled with lamps of a different color, customarily white, red or amber, and blue.

Of late, these customary units have been put on trial and found wanting. They serve principally, and almost exclusively, the first function of stage light—illumination—and are found, on the modern stage, not to serve it well. Footlights, especially, have come under the ban, though the campaign against them has been waged a little indiscriminately. When footlights alone are used in a realistic scene, they are bad. If the light from the floor dominates, the under surfaces of the face—chin, nose-tip, eyelids—are unnaturally and disagreeably accentuated. If the light from below and above is balanced, the result, though more natural, is perhaps as bad, for the lighting is flat, and there is no relief in the features or figures of the players. For plays and scenes of a heroic or fantastic sort, treated decoratively, rather than literally, lighting entirely from above gives interesting and picturesque results. It shadows the features heavily, and lends a sculptured, massive quality to the face. More and more, this overhead lighting has come to be used, and with some producers has been made a fetish.

The very quality that makes this sort of lighting interesting in scenes of a certain kind exhibits its strongest disadvantage in naturalistic lighting. In the average room, during the daytime, light pours in through windows, striking faces at face level. The light comes mostly from one side of the room, or if there are windows on more than one side, and the light comes in several directions, it comes in varying degrees. The sun does not shine in two directions at once. That is to say, though light may come from more than one direction, and be reflected multitudinously by walls and ceiling and, in less degree, the floor, the balance of intensity is always in favor of one direction. And this direction is not up or down, but in a line approaching a right angle to the erect figure.

Something of the same sort is usually true out-of-doors. Only at noon do we have literally overhead lighting. Even then, the beam of light is so broad as to envelop the figure on all sides, and is so variously reflected by the dome of the sky, by trees, rocks, water, houses, that there is, in addition to the direct downward light, a considerable “general” diffused illumination. At most hours of the day, the rays of the sun fall upon the earth and its people at a long angle. The factor that gives relief and prevents a dull flatness in the light of nature is the dominance of east over west in the morning and of west over east in the afternoon. Night illumination indoors, though usually from fixtures above head-level, is reflected by all the walls of the room and by all the objects in it.

A soft, diffused face-level lighting is thus warranted in almost all circumstances. The hard glare of foots and borders, used unrestrictedly, does not supply this need most happily. Used moderately, footlights have a distinct function, until better means of moderating the crude shadows cast from above shall have been devised.

An effort to throw light upon the stage at an angle less perpendicular than that of footlight and border has been made at the Little Theatre in New York. Here, certain sections of the ceiling panelling can be lowered and light thrown upon the stage by diffused spot lamps at an angle of 45°. In Mr. Belasco’s theatre, lights have been installed in the face of the balcony, achieving the same result even more satisfactorily. I believe that, in good time, beautifully designed lighting units will be frankly set or hung in the auditorium of the theatre.

The footlight equipment of most theatres is, as it has long been, unmodified, consisting merely of rows of incandescent lamps of low standard (usually forty watts). The border lights have seen more innovation during the past few years, especially the first (or concert) border, most used in lighting interior scenes. Originally, these border lights were intended to light not only the stage, but also the hanging strips of canvas (known as borders) formerly used to suggest a ceiling in interior scenes, and still used to represent foliage and to misrepresent the blue sky in exterior scenes. With the use of flat ceilings for interiors comes a demand for a light that illuminates the scene rather than the ceiling. This is best supplied by the X-Ray border, made up of a smaller number of lamps than the old border but of higher standard, each lamp being 150 or 250 watts. Each lamp is set in a separate compartment, separated from its neighbor, and each lamp is backed by an X-Ray reflector of mirrored glass with whorled corrugations, diffusing the light evenly over a large area. Each compartment may be fitted with a color screen of gelatine or dyed glass. Often, too, spot lamps, large and small, are mounted on this border to accentuate the light on certain areas of the stage.

The other borders, used mostly for exterior scenes, must serve to flood stage and scene with light. The old type of border does not serve adequately, even in the type of scene for which it was designed. The use of sky borders has largely given way to the high cyclorama of canvas or plaster, leaving the sky prospect open to the eye as far as the sight line reaches. The overhead lighting must be powerful enough to flood stage and sky with light. It is becoming more and more common to reinforce the ordinary border-light equipment with hanging thousand-watt lamps in specially constructed steel hoods. In the Arts and Crafts Theatre, in Detroit, Sam Hume installed his entire overhead equipment of such hanging lamps, and did away with the old border light altogether. In the average theatre, however, these lamps are more in the nature of movable lamps than of permanent equipment, and will be further spoken of below.

The Neighborhood Playhouse, New York. This building is one of the most satisfying examples of recent theatre design in America, being free from overdecoration and admirably fitted to its purpose technically. Harry Creighton Ingalls and F. B. Hoffman Jr., Associate Architects.

Auditorium of the Artists’ Guild Theatre, St. Louis. This little auditorium is made useful for both dramatic productions and art exhibitions by means of an ingenious device for tilting the floor, described on page 29. Above is the view toward the balcony, below the view toward the stage. Laurence Ewald, Architect.

The footlights and border lights, and, occasionally, vertical strips inside the proscenium frame at the sides, constitute the whole of the stage-lighting equipment that is more or less a part of the structure. They “go with the building.” Everything else is movable and falls into the second classification of lighting units. But, in the structure of the stage, provision must be made for the use of such additional lights. Outlets in the form of “stage pockets” are set at regular intervals in the stage floor; into these pockets, spot and flood lamps may be plugged. The pockets are set in the stage floor in two lines running up and down stage, a short distance behind the proscenium opening, at either side of it. There are usually from four to six such pockets on each side of the stage. Sometimes there is one at the back of the stage, and one or more in the fly-gallery. Occasionally, also, in houses served by alternating current, there are pockets served by a small house generator, supplying direct current for the use of arc lamps. In some theatres, also, there are pockets connected with storage batteries, intended to supply an emergency service or for use with lighting units of a voltage other than the usual 110 volts. The pockets must, of course, be carefully insulated, and covered with a hinged iron lid set flush with the floor.

The movable lights are of two general types: flood lights, for general diffused illumination, and lens lights, for concentrated, direct “spotting.” Under the first heading may be classed all special lights known, in stage parlance, as strips, floods, or bunches. Strips are small troughs, fitted with from three to ten sockets, and are used in lighting off-stage “backings,” set-pieces of scenery, and small areas where a special accent of color or intensity is wanted. Bunches, now largely obsolete, are hoods set on extension standards, fitted with ten or twelve sockets each. These have been replaced by flood lamps, burning 500 and 1,000-watt nitrogen-filled mazda bulbs. The hoods of these flood lamps have diverging sides or are fitted with a reflector behind the light, and have grooves at the front of the hood for carrying color-frames. Formerly such lamps were equipped with arc lights, but the nitrogen lamp has wholly displaced the arc in flood lighting. Its advantages are that it does not require an attendant to “feed” the light, that it can be dimmed, giving it range of intensity to make up for decreased brilliance, and that it can be burned on either direct or alternating current, without the annoying buzz of an arc light burning alternating current.

Spot lamps are mounted in closed iron hoods, emitting light from only one end through a lens. The hoods, like those of flood lamps, are set on extension standards, and can be tipped up or down and turned from side to side. Arc spots are still in general use, as the thousand-watt lamp is not sufficiently brilliant for use on large stages or for long throws. In little theatres, however, the thousand-watt spot is bright enough and has all the advantages over the arc that apply to the newer type of flood lamp. For such small stages, the principal consideration always should be centralized control, and it cannot be got with the arc light. As incandescent, gas-filled bulbs of still higher standard are developed, the arc spot will cease to be used, even in large theatres.

There is also a small variant of the spot light, known as a “baby” spotlight, burning a lamp of 150 or 250 watts. Used with care, this is one of the most valuable stage lights we have for producing delicate variations in light volume and color in particular areas of the stage. These small lights may also be dimmed.

******

I have referred above to hanging hoods with thousand-watt lamps for general illumination. Where these are not made a part of the permanent lighting equipment of the theatre, they may be introduced for special scenes and effects, being hung where desired, and massed in such numbers and of such colors as needed. The hoods are equipped with chains by which they may be hung upon pipe battens and tipped as desired. They are plugged, like other movable lights, into floor pockets or fly-gallery pockets.

The color of light on the stage is obtained in three ways. Where lamps of low standard (twenty-five or forty watts) are used, as in the foots or borders, they may be coated with dyes, put up for the purpose, made with a collodion base. The burning lamp is dipped into the liquid and left alight until the dye coat has thoroughly dried and hardened. Bulbs of high standard, however, cannot be dyed, as the dye does not stand up under the intense heat generated by a lamp of one hundred or more watts. As a matter of fact, few of the commercial dyes are wholly satisfactory, even with smaller bulbs. The blues especially deteriorate under heat, either fading or cracking, or burning to a purple or black.

The rays of larger lamps, burned either in flood or spotlight hoods, are colored with gelatine mediums, held before the light in frames of proper size. The gelatine colors also fade under heat, and, being very fragile, crack and tear, and must be frequently renewed. For durability, the best color medium is a sheet of glass with the color blown in. Unfortunately such glass is very costly, cannot be had in a large range of colors, and is usually not as translucent as might be wished.

Mr. Munroe Pevear of Boston has made interesting experiments with mediums of dyed glass. He manufactures his own dyes, and claims for them a much longer life than the commercial variety enjoys. His mediums are highly translucent, and are, of course, far more durable than the gelatine mediums. He makes them, however, in only the three primary colors, for his development of color screens has been ancillary to experiments of a larger intent—the development of a synthetic lighting system.

The principle of his color system is simply the principle of the prism inverted. The prism breaks white light up into its primaries. Mr. Pevear unites the primaries to make white. By combining his red, green, and blue light in varying degrees of each, he is able to obtain any color in the spectrum. To pale out his lights to tints, he includes in his border and footlight equipment a fourth circuit of white lights. To my knowledge, only one theatre has been equipped by Mr. Pevear—the Toy Theatre of Boston, now the Copley. But in the short-lived tenancy of the house by the Toy Theatre Company there was never a whole-hearted effort to test Mr. Pevear’s equipment. Experiments with synthetic lighting have been conducted at various times and places by Sam Hume, Norman Geddes, the present writer, and others. The results more than reward the effort of such experiment, and I commend a study of its possibilities to all workers in little theatres.

In addition to the typical theatrical lighting units, other units, not designed primarily for theatrical use, are being adopted. Foremost among these are the reflectors of the X-Ray type. These are made in a number of sizes and shapes, but are of two types, the whorled reflector and the parabolic reflector. The first type gives a diffused light and the second a concentrated beam. The X-Ray flood lamps, manufactured for lighting the exteriors of buildings and for illuminating night construction jobs, are coming to be used on the stage. They can be focused, have a higher efficiency than a lens light burning the same number of watts, and produce a more pleasant spot than the sharply defined light-area of the conventional spot light, projecting a brilliant ray, most intense at the center and fading toward the edges of the field. There are a number of firms manufacturing lights of this type, and they are now generally used for lighting outdoor pageants. They are quite as valuable in the indoor theatre as on the pageant field.

I have used frequently, instead of baby spots of the regular type, automobile windshield spots, burning a six-volt lamp. These cost perhaps one-tenth as much as the regular type, and can be used on a special circuit supplied with current either through a small step-down transformer or from a storage battery, kept continually charged by running current into it from a strip of carbon lights wired in series-multiple. These windshield spots are usually equipped with a swivel and trunnion mounting, so that they can be turned in any direction, are focusable, and have a clamp by which they can be fastened to pieces of scenery or upright pipe standards in the proscenium entrance.

Besides a goodly number of well-distributed stage pockets into which movable lamps may be plugged, there should be points of vantage from which lights may be cast, perches and bridges elevated above the level of the stage. Most useful is a bridge across the stage, just inside and above the proscenium. From this bridge, special flood and spot lamps may be manipulated. Often perches are built out from the wall at either side of the proscenium from which spots may be thrown down to the stage. Occasionally these are movable structures with several levels and can be wheeled to various points off stage. The fly-gallery, also, is used for spot lighting. When a false proscenium is used, the overhead bridge and side perches are sometimes built into the structure.

In planning the lighting equipment for a small stage, all thought of the usual theatre installation can be set aside. Border lights of the old type are not useful enough to warrant the expenditure of the money they cost. Footlights, too, though useful when no better means of front lighting can be devised, can well be replaced by face-level lights from the auditorium, concealed by wall traps or by the balcony rail, or hidden in decorative coverings suspended, chandelier-like, from the ceiling. The essentials for a flexible, adaptable lighting system are centralization and delicacy of control, numerous and well-situated current outlets, and as wide a variety as possible of movable lamps for flooding and spotting. There should be enough circuits to allow the use of a three- or four-color system, along the lines of the synthetic system of Mr. Pevear, described above. Along with this there must be facilities for throwing light from above the stage from bridges and movable platforms. The only permanently installed piece of lighting equipment that is absolutely necessary is the X-Ray border at the front of the stage for the lighting of interior scenes.

With a carefully planned switchboard and dimmer-bank, and numerous pockets or current outlets, for the initial equipment, there is hardly any limit to the development of the little theatre’s lighting facilities, for if it must begin with only a few lighting units, it can acquire more from time to time, and with each acquisition build up its means of achieving beauty. And in this direction the most vital contributions to the craft of the theatre are yet to be made.

Figure 9—The permanent “scene” of the Théâtre du Vieux Colombier. See page 74. (From Album du Vieux Colombier by Fauconnet.)

CHAPTER VI.

STAGE MACHINERY AND SETTINGS

I have made mention earlier of the ingenuity so often demanded of the little theatre stage director. The limitations of his stage often compel him to an inventiveness different only in scale from that displayed by the great German technicians of the theatre. No Harvard student who ever shifted scenery for the Dramatic Club in Brattle Hall can outgrow his enthusiasm for the feats achieved on that absurd stage. At the Artists’ Guild in St. Louis, it gave us unbounded glee to set the massive chamber of The Queen’s Enemies on the cramped stage there. To be confronted with deficiencies of one sort or another—mechanical or fiscal—which must be overcome, is unquestionably a spur to ambition. To struggle with material barriers, space, time, physical means, and accomplish results in spite of them; to wring beauty out of meagre cheesecloth and tinsel when there is no money for silk and gold galloon, is a victory of sorts; and without the fighting and winning of such battles as these, half our little theatres might never have been, and much of their best work might not have been done.[5] Practically all modern stage machinery has been devised to heighten effects of nature, and therein it differs from the machinery of the theatre of the greatest eras, which was devised to produce effects beyond nature. The Greeks and Elizabethans left Nature strictly to herself, but had a fairly elaborate mechanical system by which they exhibited gods, demons, ghosts, and visions.

[5] Note.—I wish to qualify fundamentally my admiration for the ingenuity of the mechanical features of the modern stage. In fact, I do not believe they can advance the theatre one jot. They are marvelously ingenious in denying the limitations of the stage and in part triumphing over them. Yet I have a persistent feeling that the recognition of the limitations and the acceptance of them is more fundamental in the development of an art or craft than the denial of them and the triumphing over them. Even such a triumph has its ultimate boundaries, and when they have been reached, there is little to do but acknowledge defeat. When matter has been twisted and beaten into the cunningest perversions of its first form, the craftsman is still not satisfied; for his spirit can soar to further reaches where none of the elements can follow. This is truer of the theatre artist, perhaps, than of any other, save the musician (who is, after all, a theatre artist). The theatre has been, these many centuries, the theatre because of the limitations that encompass it, not in spite of them. Likewise is the church (as a field of art) limited, and it is by merit of its limitations that the church has been great. Utter churchliness owes little to the style of architecture of any specific church edifice. And the transcendent theatre art of the Deutsches Theater in Berlin or of the Art Theatre in Moscow does not hang upon the skill with which the one has used a revolving stage or with which the other has devised its scenery. The German theatres have to a remarkable degree increased natural illusion in scenery and lighting; but in spite of that there is about as much bad theatre art in Germany as good. Where greatness is found, where the artist has most truly realized the function of the theatre, it will be seen that his spirit has transcended utterly the possibilities of his physical stage; and, like as not, he has made no effort to strain the capacities of his medium, but has worked utterly within them. One of the remarkable facts about the stage technique of Robert Edmond Jones is that he demands nothing impossible to achieve. His designs are easy to execute, and his scenery easy to handle.

Here, again, is the dilemma which we faced in the discussion of the approach to the stage lighting problem. There are limits to our ability to reproduce on the stage the light effects of nature. But there are practically no limits to the theatrical expressiveness of light, regarded as a medium, per se. There are limits beyond which mechanical skill or inventive genius cannot alter the obdurate confines of the physical stage. But there are no heights to which a human spirit, set in public upon a platform, however narrow and close-walled, cannot rise. In view of this great spiritual fact, I would solemnly warn any little theatre or community house that has money to spend for modernity, not to spend it on the kind of advance stage machinery discussed in this chapter, but to spend it on artists.

One of the first mechanical improvements of our present-day stage was the drehbühne, or revolving stage, invented by Herr Lautenschlager. Its purpose is to move, without inordinate intermissions between acts, scenery far heavier than men can handle. The cult for realism demanded a greater plasticity in scenery, and consequent increase in mass and structural complexity. The revolving stage is a great turntable on which as many as six or seven scenes can be set at one time, and revealed successively to an audience by revolving the table. The scenery for the entire play is set up on the day of the performance, and no shifting of scenes need be done during the progress of the play.

The designing of scenery to fit the revolving stage, developed to its highest point by Reinhardt, is so little understood in this country that our few revolving stages are seldom used. The Century Theatre stage in New York has a turntable, but I do not know of any instance in which the scenery for an entire performance was set upon it. Mr. Winthrop Ames had a revolving stage installed in his Little Theatre in New York; but, as this stage is only thirty-five feet in diameter, he found it inadequate for the setting of many of the scenes. Mr. Harry Bishop, in building the Liberty and Fulton Theatres in Oakland, California, constructed revolving stages of adequate size, but evaded the problem of devising scenery especially for them by installing a revolving gridiron also, so that the old-fashioned sky and foliage borders could ride around the stage with the set to which they belong. A little labor is saved in shifting scenes during performances, but I doubt whether the saving equalizes the cost of installation of these expensive devices.

A device of similar intent is the sliding stage, a great wagon the size of the stage opening—or, rather, two or three of them—run, as desired, before the proscenium opening, and capable of being pushed off, after being used, into houses at either side of the stage or lowered to the basement, there to be reset for another scene. This device avoids some of the limitations of the revolving stage, in that scenes need not be made to articulate closely as they must in order to fit the circular bounds of the turntable; but it is tremendously costly, and requires a great stage space.

There are other devices of like intent, such as the Asphalia stage, built in transverse sections that can be raised and lowered on hydraulic plungers, and Steele MacKaye’s elevator stage installed in the old Madison Square Theatre, New York. None of these devices can serve either the little theatre movement or the art of the theatre. They are deadening, and divert effort from the true end of all experiment and advance in the theatre. There is no doubt in my mind that the sort of theatre that wants to be built is one in which the machinery is reduced to a minimum,—efficient, controllable, but never controlling the sort of work that must be done on the stage. In order to have a modern, well-equipped stage, none of these innovations is needed.

Of far more purpose, for the modern theatre, are certain tendencies now manifest that appear at first glance like reversions to an older type of stage. I refer chiefly to such a stage as that built by M. Jacques Copeau for his Théâtre du Vieux Colombier, which, for two seasons, was a strange intruder among the more literal stages of New York. Indeed, save for the use M. Copeau made of modern mechanical flexibility, his stage was a first cousin to the Elizabethan stage, though his arrival at its particular form was not a case of atavism but a philosophic realization of the true limitations of the theatre. His stage consisted of three parts: a fore-stage, reached from the rear stage, or from the main floor of the auditorium by steps upward, or from doors high in the walls flanking the proscenium, whence steps led down to the stage level; second, the stage proper; and third, an upper stage, or balcony, engirdling the main stage. This balcony and the space below it might be variously shut off from the main portion of the stage, by tapestries, lattices, screens, or sections of scenery, flat or pierced with windows or doors. Steps could be variously placed to give access to the balcony.

Thus, without the use of strictly representative scenery, Copeau had a stage which provided every facility for the presentation of a play,—entrances, exits, and elevations. It gave scope to the necessities of action and the agility of the actor. Such a construction may be said to be as much scenic reform as reform in mechanics, except that it largely renders the latter unnecessary.

I should not deem it part of the purpose of this paper to mention scenic matters at all, were it not that, very often, a certain amount of scenery, like a certain amount of lighting equipment, “goes with the building”. The contract for the building and its rigging often specifies also a “garden”, “plain chamber number one”, and “fancy parlor number three”, or the like. Whether they are thrown in or not, without extra charge, they should be courteously but firmly refused. They stunt the timid imagination, and somehow, perhaps because they are “real” scenery, never get thrown away.

For the scenic equipment of the stage I can do nothing better than refer the reader to the permanent setting devised by Sam Hume for the Detroit Arts and Crafts Theatre, of which he was for two seasons the director. This setting consists of a certain number of interchangeable units, flats, door pieces, window pieces, arches, and pylons.[6] Its initial cost is low, far lower than that of several sets out of the scene painter’s catalogue, and its usefulness infinitely greater. In addition to this it has beauty.

[6] Mr. Sheldon Cheney in his The Art Theatre has fully described and illustrated this set, showing the multiple variations it is capable of.

It may be that the stage of the future is to be something quite different than that we now have. As a theatre of truth supplants the theatre of illusion, it may be found that the stage of to-day does not answer at all. The theatre is undoubtedly in a transitional period and artists are striving for new forms and new methods of presentation. What directions these tendencies may take it is not the purpose of this paper to forecast. Nor would it do to advise the adoption of a type of stage not yet tested or of widespread use. Where there is an experimental and creative attitude toward the theatre such types will be evolved without any such rudimentary manual as this. Where a manual is wanted, a stage should be built that can be used easily, by everybody who wishes to use it, and which will give readily, in return for effort spent upon it, a revenue of beauty. These pages will achieve enough if they go a little way toward eliminating the usual inept, difficult constructions that for these many years have cumbered the way of folks, young and old, who wish to entertain themselves in the theatre. More and more, they seek such entertainment at their own hands. More and more, their efforts are being fostered by educational bodies and organizations allied with the theatre. Such aid as this pamphlet may bring them is hopefully dedicated to their service.

A SELECTED BIBLIOGRAPHY

HISTORICAL AND DESCRIPTIVE

Martin Hammitzsch, Der Moderne Theaterbau (Teil I). Berlin: E. Wasmuth, 1905. (This is perhaps the best book on the historical aspect, although only the first volume has so far appeared.)

Edwin O. Sachs and E. A. Woodward, Modern Opera Houses and Theatres. 3 volumes. London: B. T. Batsford. 1896-98.
(This monumental and very useful series is generally considered the standard descriptive and technical work, but is now somewhat out of date.)

Edwin O. Sachs, Stage Construction. London: B. T. Batsford, 1898.
(A supplement to the above.)

Manfred Semper, Theater. Stuttgart: Arnold Bergsträsser, 1904.
(Handbuch der Architektur, Teil 4, Halb-Band 6, Heft 5.)

Roy C. Flickinger, The Greek Theatre and Its Drama. Chicago: The University of Chicago Press, 1918.
(Contains the best summary of the conflicting views about the form of the ancient theatre.)

Arthur Elam Haigh, The Attic Theatre. Third Edition, revised. Oxford: The Clarendon Press, 1907.
(A standard work on the Greek Theatre.)

Brander Matthews, A Study of the Drama. Boston: Houghton Mifflin Company, 1910.
(Chapter III treats of the form of the theatre in relation to the forms of drama.)

William Harvey Birkmire, The Planning and Construction of American Theatres. New York: J. Wiley and Sons, 1896.
(Contains many plans and descriptions of the older American theatres.)

Max Littmann, Das Münchner Künstlertheater. Munich: I. Werner, 1908.
(A monograph describing one of the best small theatres in Europe, fully illustrated with plans and photographs.)

Julius Bab, Die Volksbühne in Berlin. Berlin: E. Wasmuth, 1919.
(Describes and illustrates one of the best large buildings of the “people’s theatre” type.)

Max Littmann, Die Königlichen Hoftheater in Stuttgart. Darmstadt: A. Koch, 1912.
(Describes and illustrates an excellent example of the institutional or “court” playhouse, in a building containing two complete theatres.)

TECHNICAL

Edward Bernard Kinsila, Modern Theatre Construction. New York: The Moving Picture World, 1917.

Arthur S. Meloy, Theatres and Motion Picture Houses. New York: Architects’ Supply and Publishing Company, 1916.

William Paul Gerhard, Theatres: Their Safety from Fire and Panic, Their Comfort and Healthfulness. New York: Baker and Taylor, 1915.

Arthur Edwin Krews, Play Production in America. New York: Henry Holt and Company, 1916.
(Contains brief but comprehensive chapters on stage machinery, lighting, and other technical matters.)

Bühnen Beleuchtung System Fortuny.
(Describes the important Fortuny lighting system.)

SCENERY

Edward Gordon Craig, Towards a New Theatre: Forty Designs for Stage Scenes. New York: E. P. Dutton and Company, 1913.

Jacques Rouché, L’Art Théâtrale Moderne. Paris: Edouard Cornély & Cie., 1910.

Sheldon Cheney, The Art Theatre. New York: Alfred Knopf, 1917.

Hiram Kelly Moderwell, The Theatre of To-Day. New York: John Lane Company, 1914.

Theatre Arts Magazine. 1916 to date.
(Contains several hundred illustrations of stage settings, stage plans, etc.)

THEATRE ARTS
MAGAZINE

An Illustrated Quarterly

Subscription price, $2.00 a year

BACK NUMBERS
containing articles, plays and sketches by

Gordon Craig | Robert E. Jones
Lee Simonson | Gilbert Cannan
W. B. Yeats | Stark Young
Walter Prichard Eaton |
Susan Glaspell | Arthur Hopkins
Eugene O’Neill | Rollo Peters
Sam Hume | Zoe Atkins
John Drinkwater |

PRICES—UNBOUND—POSTPAID

Volumes I-IV (complete), $20.00; Volume II, $3.00; Volume IV, $4.00. (Volumes I and III sold only with complete sets). All issues except those for February and May 1917, May 1918, October 1919, January and October 1920, can still be had singly at 75 cents.

SPECIAL: Volume I-IV, bound, $25.00.

THEATRE ARTS MAGAZINE

Transcriber’s Notes:

Variations in spelling and hyphenation are retained.

Perceived typographical errors have been changed.

*** END OF THE PROJECT GUTENBERG EBOOK ON BUILDING A THEATRE ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

Table of Contents

- ON BUILDING A THEATRE

- INTRODUCTION

- CHAPTER I.

- CHAPTER II.

- CHAPTER III.

- CHAPTER IV.

- CHAPTER V.

- CHAPTER VI.

- A SELECTED BIBLIOGRAPHY

- THE FULL PROJECT GUTENBERG LICENSE